cond-mat/9908160 v2 16 Aug 1999

Mach - Zehnder B ragg interferometer for a

B ose - Einstein Condensate

Yoshio Torii, * Yoichi Suzuki, Mikio Kozuma and Takahiro Kuga

Institute of Physics, University of Tokyo, 3 - 8 - 1 Komaba, Meguro - ku, Tokyo 153 - 8902, Japan .

Lu Deng and E.W. Hagley

National In stitute of Standards and Technology, Ga i thersburg, M D 20899, USA.

Abstract:

Weconstruct a Mach - Zehnder interferometer usingBose - Einsteincondensedrubidiumatoms and optical Bragg diffraction. Incontrast to interferometers based on normaldif fraction, where onlya small percentage of the atoms contribute tothe signal, our Braggdiffractioninterferometer uses all the condensate atoms. T he condensate coherenceproperties andhighphase - spacedensityresult in an interferencepattern of nearly 100% contrast. In principle, the enclosedarea of the interferometer maybe arbitrarilylarge, makingit anidealtoolthat could beused inthedetection of vortices, or possibly even gravitational waves.

PACS number(s):03.75.Fi, 03.75. - b, 03.75.Dg, 39.20

Paper:

With the advent of Bose - Einsteincondensation (BEC) of dilute atomic gases [1,2] comes a coherent matter wave , or atom laser [3 - 5] , analogous to an optical laser . Thehighphase - spacedensityand coherenceproperties of condensates make possibleatom - optic experiments that havepreviously onlybeen performed with optical lasers , such as four - wavemixing [6] . Amongthese, atom - laser (matter - wave) interferometers [7, 8] areof particular interest becauseof their potential highsensitivity . In order to be ableto utilizeatomlasers as one does opticallasers, atom - waveversions of optic al elements , suchas 50/50 beamsplitter s and mirror s, areneeded . The recent demonstration of optical Bragg diffraction of a BEC by a moving, optical, st anding wave [ 9 ] pointedthewaytowardtherealization of that goal . Bragg diffraction efficiency canbe varied from0 % to100 % by simplyadjustingthe Bragg - pulseduration and/or intensity

[10, 11]. T his means that Bragg diffraction can functionas an ideal, adj u stable beam splitter/mirror for a

BEC, providingus withthecritical atom - optic elements needed for constructing an atom - laser interferometer. Inthis Letter we report thefirst demonstration of a Mach - Zehnder interferometer for a

BEC using an optical Bragg - diffraction technique . This not onlyallows novelstudies of thecoherence properties of a BEC itself, such as vorticity[12], but alsopaves theway toward extremely sensitiveatom - waveinterferometer s that couldbe usedto detect gravitat ional waves.

Atom - waveinterferometers comprised of opticalstandingwave s canbeclassified in to two types , those based on normal diffractionandthosebased on Bragg diffraction . Inthecase of normaldiffraction there are many spurious momentumspacep aths and only a small fraction of atoms ( ~ 10%) cancontributeto the signal [1 3 ]. W ith Bragg diffraction however , the atom ic wavecanbe coherentlysplit into onlytwopaths , and thencoherently recombined. T his results in high efficiency[1 4 ] where, in principle, all of the atoms cancontribute tothe signal . NormalandBragg diffractionbased atom - waveinterferometers were first demonstrated in1995 using collimatedmetastable atomic beams, andfringecontrasts of 10% (normal) and

62% (Bragg) wereobta ined [1 3 ,1 4 ]. Th is is to becomparedto our BEC Bragg - diffractioninterferometer whereall the atoms contributetothesignal due to the condensate ´s extremely narrowvelocityspread. We achievenearly the maximumcontrast of 100 % with a goodsingle - sho t visibility .

Bragg diffraction occurs whentheatomic matter wave (a BEC nearlyat rest) is coherently scatteredby a moving, optical, standing waveformedbycounter - propagatinglaser beams of slightly different frequencies. Themechanismof Bragg diffr actioncan be most easilyunderstood as a two - photon stimulatedRamanprocess [ 9 ] , wherephotons from onelaser beamare coherently scattered into the other, changing the atomic momentumintheprocess . Thefrequency differencebetween the two counter - pro pagating Braggbeam s is chosen to correspondto the energy difference between the twomomentum states. Inprinciple, the initial momentumstate | p = 0

! k > canbe coupled to anymomentumstate | p =

2 n ! k > ( n integer) usi ng n th - order Bragg diffraction. In our casewechoose tocouple momentumstates | p

= 0> and| p = 2

! k > ( k =2 p / l , and l = 780 nmis the laser wavelength). The momentum - space

wavefunction of a condensate ( initially instate | p = 0> ) continuously irradiated with Bragg diffraction

beams will oscillatebetweenthetwocoupled momentumstates just as if it were a two - level system. The

effective oscillationfrequencyis W eff = W 1 W 2 /2 D , where W 1 and W 2 aretheresonant Rabifrequencies of two

Braggbeams , and D is the detuning of thebeams fromthe optical transition [ 11, 15]. A s mentioned

earlier, a n arbitrary percentageof the atoms can betransferredtothe | p = 2 ! k > momentumstate b y

properly adjusting the intensity, detuning , and/ or duration of the Braggpulse.

This closedtwo - level systemcan bemost easilythought of as a fi ctitious spin1/2 system, where we

define | g > º | p = 0 ! k >, and | e > º | p = 2 ! k >. As usual, a p /2 ( p ) pulse is onethat results in transferring

half (all) of the atoms from | g > to| e > . Moreprecisely, thestate vector of thesystemunder a p /2 - pulse

obeys thetransformation equations | g > ® (| g > - e

- i j

| e >)/ 2 , and| e > ® (e +i j | g >+| e >)/ 2 . Here j is the

phaseof themovingstanding wave inthe center of theinitial atomic wavepacket | g > i nthe middle of the

Braggpulse. Changes in j aremeasuredwith respect to the phase of the resonant, movingstanding wave.

Successive application of this transformationshows that under a p - pulse| g > ® - e

- i j

| e >, and | e > ® e +i j | g >.

Wecan therefore usea p /2 ( p ) pulse as a nideal beamsplitter (mirror) for thecondensate.

Wepreparea BEC of rubidiumatoms usinga dc magnetic trap and a standardevaporationstrategy [1,

1 6 ]. Briefly, we first trap about 10 9 87 Rb atoms inan ultra - high vacuumglass cell us ing a doublemagneto -

optical trap [1 7 ] . Theatoms are then transferredinto a cloverleaf magnetic trap [1 8 ] andcooled using rf -

inducedevaporation. Every5 minutes we create a BEC containingabout 10 5 atoms in the 5S 1/2 F = 1, m F =

- 1 state, ina trap w ith radial gradient, axialcurvature, and bias field of 1.75 T/m, 185 T/m 2 , and 10 - 4 T,

respectively. Duetothegeometry of our magnetic trap, the condensate is cigar - shaped withthesymmetry

axis perpendicular to the direction of gravity. Werelease th econdensate bysuddenlyswitch ing off the

magnetic trap within 200 m s , wait 5 ms for the mean - field driven explosive expansiontosubside, and apply

a Bragg interferometer pulse sequence . After 20 ms of freeevolution toallow the | g > and| e > components

enough timeto separate significantlyinspace, an absorptionimage [1] of the resultingcondensate is taken .

This yields verycleanandunambiguous signals sincethe action of the interferometer is mappedinto the

probability of observingatoms intwo sp atiallyseparatedregions.

Themoving, optical, standing wave is generated using twocounter - propagatinglaser beams with

parallellinear polarizationbut slightly different frequencies . These twolaser beams arederivedfroma

singlediodelaser using ac ousto - optic modulators, andthe spatialmodeof eachbeamis purifiedby passing

themthrough single - modefibers. Thelight propaga t es parallel to t he symmetry (long) axis of the trapped

condensate , and t he frequency differencebetween the twolaser beam s is d = 15 KHz. This relative

detuning corresponds tothe two - photon recoil energy for rubidium mentioned earlier . Our laser intensities

were chosensuchthat W 1 /2 p = W 2 / 2 p @ 5 MHz . Tosuppress spontaneous emission we useda detuning

D /2 p = 2GHz . Theseparameters result inan effective two - photon Rabi frequency of W eff /2 p @ 6.3 kHz.

The experimental schematic of our atom interferometer is shownin Fig. 1. The mo mentum - space

condensate wavefunction Y , initiallyin state | g > (| p = 0 ! k >), is coherently split by the first ( p /2 ) pulse and becomes Y 1 = (| g > - | e >)/ 2 . Here, without the loss of generality, we havechosen j = 0 (when j ¹ 0 there

is an additional, physically meaningless global phase multiplying the final wavefunction). Inreal space

these two different momentumstates beginto separateand , after a delay D T (measured fromthecenter of

successive Bragg pulses), the seco nd ( p ) pulse is applied, producing Y 2 =

(| g >+| e >)/ 2 . Nowthe two spatially separatedparts of Y 2 beginto convergebecause theaction of the p - pulsewas effectively that of a mirror inmomentumspace . After another equal delay D T, the two parts of Y 2 from the two different coordinate - space paths overlap completely , and the third ( p /2 ) pulse is applied yielding Y 3 = - | g >. Inthis case theprobability of findingtheatoms in theinitial state| g > after the sequenceof three Bragg pulses is

P g =|< Y 3 | g >| 2 =1, regardless of thedelay D T between the pulses . If, however, thephase of themoving, standingwavewerealtered by f before applyingthethird Braggpulse, Y ’ 3 = - [(1+e i f )| g >+(1 - e - i f

)| e >]/2, a nd P g =[1+cos( f )]/2 ( P e =[1 - cos( f )]/2) . Fringe s inthefinal probability of observingtheatoms in the initial

(or final) momentumstatemay therefore bemapped out by varying f just beforeapplying the final p /2

Braggpulse.

TheBragg - pulseduration(for fixed W eff and D ) neededto producea p /2 ( p ) pulse was first measured experimentally . Figure s 2 a - c showabsorption images of thecondensate after applying a single Bragg pulse of duration t = 0, 40 ( p /2 - pulse) , and 80 ( p- pulse) m s respectively . Thecondensate images are elliptical becauseof its in itial anisotropic shape [1,16]. The experimentally determined durations areinexcellent agreement with the calculated values of t = 40 m s and 80 m s based onthemeasuredlaser intensities and detuning. Once the p /2 ( p ) pulse durations were empirically d etermined, weproceeded withtheactual interferometer experiment (Fig. 1 ) byapplyingthe p /2 - p - p /2 sequence of three Braggpulses . The relative phase f of the third p /2 pulse was experimentally adjustedin therange 0

� £ f £ 3.5 p bythe changing the phas eof oneof the twoBragg beams comprisingthemovingstanding wave with an electro - optic modulator

(EOM).

Figure 3 shows theresultant oscillation of the population inthe| e > stateas a function of f when D T =

190 m s (eachpoint represents a single meas urement). Notethat we observean interference patternwith almost 100 % contrast. Because the Bragg beams were not perfectly perpendicular tothedirection of gravity , the falling condensates seea differential phaseshift even when f =0 . This results i nthesmall

~ 0.1 p phase shift inthefringepattern of Fig. 3. This phase shift corresponds toanangle misalignment of a few degrees fromperpendicular , whichis well within our experimental uncertainty.

The chosen pulseintervalof 1 9 0 m s corresponds toa 2.2 m msepara tion of the twoarms of the interferometer, or about six times theperiod of the optical standing wave madebythe Braggbeams. Since the sizeof thecondensate inthedirection of momentumtransfer is roughly50 m m, D T > 5 ms is necessary toseparate com pletely the two arms of theinterferometer . However, we found that when D T > 2 ms, reproducibility of the interference pattern deteriorate s significantly. When D T =3 ms , the resultingfringe pattern is completely random, ranging from0 % to100 %. T his i ndicates that the recombining wavepackets arefullycoherent , eventhough their relativephaseis not well controlled. The phase stability of theBraggbeam s was measured with a homodynedetectiontechniqueand was foundtobeshorter than1 ms. This expl ains thelack of reproducibility at long D T andwe suspect that the randomrelativephasei s duetomechanical vibration of the numerous mirrors used for the Braggbeams. Webelieve that a stable signal contrast of 100 % visibility can beachieved at long D T by activelystabilizingthesecriticalBragg mirrors. T his would mean that we could realizea stable interferometer whose two arms werecompletely separatedinspace, resultingin a verylarge enclosed area.

TheBragg interferometer presentedherei s a novel tool that canbe usedto studythe phase properties of condensate s . For example, it should bepossibleto detect thephasesignature of a vortex in a Bose - Einstein condensate with this interferometer [1 2 ]. Avortex state could becreatedin one armof theinterferometer andanalyzed byinterfering it withtheother arm. The resultant momentum - spacemap of the condensate phaseafter thefinal p /2 - pulsecouldthen be analyzedwithconventional imagingtechniques [1]. In additionto studyingfundamental properties of condensates, sucha BEC interferometer might proveuseful inthedetection of gravitional waves becauseof its highsensitivityan d highsignal - to - noise ratio. Although promising, themean - field interaction of theatoms themselves may cause interferometer instabilityat long

D T becauseof shot - to - shot ( N ) variations inthe number of atoms in eacharmof the inter ferometer after the first p /2 - pulse. We are currentlyworking onstabilizing andmeasuring the limitations of our Mach -

Zehnder atominterferometer.

Wethank T . Sugiura for technical assistanceand helpful discussions. This work has been supportedby a Grant - in - AidfromtheMinistr y of Education, Science, andCulture, as well as by Core Researchfor

Evolutionary Science and T echnology (CREST) of the Japan Science andTechnology Corporation(JST ).

*Current address: Department of Physics, GakushuinUniversity, Mejiro1 - 5 - 1, Toshima - ku,

Tokyo171 - 8588, Japan

References

[1] M. H. Anderson , J. R. Ensher, M.R. Matthews, C. E. Wieman, andE. A. Cornell , Science 269 , 198

(1995) .

[2] K. B. Davis, M . - O. Mewes, M. R. Andrews, N. J. van Druten, D. S. Durfee, D. M. Kurn, and W.

Ketterle , Phy s. Rev. Lett. 75 , 3969 (1995) .

[3] M. - O. Mewes, M. R. Andrews, D. M. Kurn, D. S. Durfee, C. G. Townsend, andW. Ketterle , Phys.

Rev. Lett. 78 , 582 (1997) .

[4] I. Bloch , T . W. Hänsch, andT. Esslinger, Phys. Rev. Lett. 82 , 3008 (1999) .

[5] E.W. Hagley, L. Deng, M. Kozuma, J. Wen, K. Helmerson, S. L. Rolston, andW. D. Phillips, Science

283 , 1706 (1999).

[6] L. Deng, E. W. Hagley, J. Wen, M. Trippenbach, Y. Band, P. S. Julienne, J. E. Simsarian, K.

Helmerson, S. L. Rolston, andW. D. Phillips, Nature 398 , 21 8 (1999).

[7] Atom Interferometry , edited byP.R. Berman, Academic Press, Cambridge, 1997.

[8] D. E. PritchardandP. L. Gould, J. Opt. Soc. Am. B 2 , 1799 (1985).

[9] M. Kozuma , L. Deng, E. W. Hagley, J. Wen, R. Lutwak, K. Helmerson, S. L. Rolston, and W. D.

Phillips , Phys. Rev. Lett. 82 , 871 (1999) .

[10] P. J. Martin, B. G. Oldaker, A. H. Miklich, and D. E. Pritchard, Phys. Rev. Lett. 60 , 515 (1988).

[11] D. M. Giltner , R. W. McGowan, and S. A. Lee , Phys. Rev. A 52 , 3966 (1995) .

[12] E. L. Bolda, D. F. Wal ls, Phys. Rev. Lett. 81 , 5477 (1998) .

[13] E. M. Rasel , M. K. Oberthaler, H. Batelaan, J. Schmiedmayer, andA. Zeilinger , Phys. Rev. Lett. 75 ,

2633 (1995) .

[14] D. M. Giltner , R. W. McGowan, andS. A. Lee , Phys. Rev. Lett. 75 , 2638 (1995) .

[15] Elements of QuantumOptics 3 rd ed. , edited by P. Meystre and M. Sargent, Springer - Verlag, Berlin ,

1998 .

[16] U. Ernst , A. Marte, F. Schreck, J. Schuster and G. Rempe, Europhys. Lett. 41 , 1 (1998) .

[17] C. J. Myatt, N. R. Newbury, R. W. Ghrist, S. Loutzenhiser, and C. E. Wieman, Opt. Lett. 21 , 290

(1996) .

[18] M. - O. Mewes , M. R. Andrews, N. J. vanDruten, D. M. Kurn, D. S. Durfee, andW. Ketterle, Phys.

Rev. Lett. 77 , 416 (1996) .

Figure captions

Fig. 1) Experimentalschematic of the p /2 - p - p /2 Mach - Zehnder Br agginterferometer .

Fig. 2 ) Absorption images of the Bosecondensate taken 20 ms after one Bragg pulse is applied (upper), and density profiles taken through the center of the condensates (lower) , as a function of thepulseduration t .

Fig. 3) Populati on oscillation of thecondensate in the | p = 2 ! k > ( | e > ) momentumstateas a function of the phaseshift f of thethird Braggpulse. The timeinterval between the center of successive Braggpulse s is

D T = 190 m s.

BEC g

2hk

Fig.1 Y. Torii et al. "Mach-Zehnder Bragg interferometer..."

Free fall

2hk 0

0 2hk

0

2hk 0

1mm

g

-0.3 0 0.3

3

2

1

0

-0.3 0 0.3

Optical density

= 0 s = 40 s

-0.3 0 0.3

= 80 s

Horizontal position [mm]

Fig.2 Y. Torii et al. "Mach-Zehnder Bragg interferometer..."

(a) (b) (c)

F i g . 3 Y . T o r i i e t a l . " M a c h - Z e h n d e r B r a g g i n t e r f e r o m e t e r . . . "

Populationof2hkmomentumstate[%]

P h a s e s h i f t [ r a d ]

0 p 2 p 3 p

0

2 0

4 0

6 0

8 0

1 0 0