arXiv:hep-ex/0007030v1 17 Jul 2000

LBNL-46257

Search for Direct CP Violation in Non-Leptonic Decays of Charged Ξ and Λ Hyperons

K.B. Luk,^{1,2} H.T. Diehl,^{6,a} J. Duryea,^{5,b} G. Guglielmo,^{5,a} K. Heller,^5 P.M. Ho,^{1,c} C. James,^3 K. Johns,^{5,d} M.J. Longo,^4 R. Rameika,^3 S. Teige,^{6,e} G.B. Thomson^6 Fermilab E756 Collaboration 1 Physics Division, Lawrence Berkeley National Laboratory, University of California, Berkeley, CA 94720 2 Department of Physics, University of California, Berkeley, CA 94720 3 Fermilab, Batavia, IL 60510 4 Department of Physics, University of Michigan, Ann Arbor, MI 48109 5 School of Physics, University of Minnesota, Minneapolis, MN 55455 6 Department of Physics and Astronomy, Rutgers–The State University, Piscataway, NJ 08854 (February 15, 2019)

Abstract

A search for direct CP violation in the non-leptonic decays of hyperons has been performed. In comparing the product of the decay parameters, α_Ξα_Λ, in terms of an asymmetry parameter, A_{ΞΛ}, between hyperons and anti-hyperons in the charged Ξ → Λπ and Λ → pπ decay sequence, we found no evidence of direct CP violations. The parameter A_{ΞΛ} was measured to be 0.012 ± 0.014.

PACS numbers: 11.30.Er, 13.30.Eg, 14.20.Jn, 14.65.Bt Typeset using REVTEX

A few years after the discovery of charge-conjugation/parity (CP) violation in the neutralkaon decay [1], Sakharov suggested that this CP asymmetry was one of the three conditions necessary for explaining the domination of matter over anti-matter in the Universe [2]. To date, CP nonconservation is only seen in K^0_L decays, and the origin of this phenomenon remains a mystery.

In 1958, Okubo pointed out that time reversal (T) invariance, or CP symmetry under CPT conservation, could be tested by establishing the equality of the partial decay rates between Σ^+ and its charge-conjugate decay [3]. Pais independently stressed that if CP symmetry is exact the slope parameter, α_Λ, of the Λ^0 → pπ^− decay should be equal in magnitude but opposite in sign to α_Λ of the Λ^0 → pπ^+ decay [4]. However, quantitative analysis on the validity of CP conservation in non-leptonic hyperon decays was not available until the early 1980’s. Contrary to the CP asymmetry of K^0_L observed in 1964, which is related to K^0-K^0 mixing and is called indirect CP violation, CP nonconservation in the strange-baryon sector is classified as direct CP violation and is due to different dynamics in the decay of a hyperon and its antiparticle. Models other than the superweak type [5] generally predict that CP symmetry is broken in strange-baryon decays [6–11]. Recasting Pais’s proposal an asymmetry A_Λ is defined as

A_Λ = α_Λ + α_Λ α_Λ − α_Λ (1) for the Λ decay. The amount of CP-odd effect is found to depend on the strong phase shifts of the final state of the decay and the CP violating weak phases which are model-dependent. A_Λ is estimated to be (2 − 5) × 10^{−5} in the standard model [9,11], but it can be as large as a few times 10^{−4} in the other models [12–14]. For the charged Ξ → Λπ decay, A_Ξ is expected to be smaller than A_Λ by about a factor of ten because the strong phase shifts of the Λπ final state are predicted to be small [15].

There have been three experimental searches for CP violation in Λ decay reported [16–18]. The most precise result came from PS185 at LEAR with A_Λ = −0.013 ± 0.022. There is no measurement available for A_Ξ.

In this letter we present the result on a new search for direct CP violation in hyperon decay by determining the sum of A_Λ and A_Ξ. In our experiment, E756, the search was performed with polarized Λ^0(Λ^0) obtained from the decay of polarized Ξ^−(Ξ^+). According to the Lee-Yang formula, the polarization of the daughter Λ, P_Λ, in the Λ rest frame is related to the polarization of Ξ, P_Ξ, in its rest frame by [19]

P_Λ =

(α_Ξ + P_Ξ · p̂_Λ)p̂_Λ + β_ΞP_Ξ × p̂_Λ + γ_Ξp̂_Λ × (P_Ξ × p̂_Λ) (1 + α_ΞP_Ξ · p̂_Λ)

, (2)

where p̂_Λ is the momentum unit vector of the Λ in the Ξ rest frame, and β_Ξ and γ_Ξ are the other two decay parameters for the Ξ → Λπ decay. The distribution of the protons in the Λ helicity frame, after integrating over the solid angle of Λ in the Ξ rest frame and the azimuthal angle of the proton in the Λ helicity frame, is given by dn d cos θ_{pΛ} = 1 2 (1 + α_Λα_Ξ cos θ_{pΛ}), (3)

with θ_{pΛ} being the angle between the momentum of the proton and p̂_Λ. If CP is an exact symmetry, the product α_Λα_Ξ should equal α_Λα_Ξ. By introducing an asymmetry parameter

A_{ΞΛ} = α_Λα_Ξ − α_Λα_Ξ α_Λα_Ξ + α_Λα_Ξ

≃ A_Ξ + A_Λ , (4)

CP symmetry can be studied in the Ξ → Λπ, Λ → pπ decay sequence. A non-zero value for A_{ΞΛ} will signal the breaking of CP invariance in the decay.

Our experiment was carried out in the Proton Center beam line at Fermilab. Fig. 1 shows the plan view of the spectrometer. The details of the experiment can be found in [20] and references therein. An 800 GeV proton beam, with a typical intensity of 3 × 10^{10} protons in 23 sec, was used to produce Ξ^− by striking a 0.2 cm × 0.2 cm × 9.2 cm-long beryllium target at an angle of 2.4 mrad in the vertical plane relative to the proton beam. The sign of the production angle was flipped regularly to minimize temporal systematic problems. The Ξ^− hyperons were momentum selected by a curved channel inside a 7.32 m-long dipole magnet M1. The data presented here were collected with M1 operating at a vertical field of 2.09 T. Typically the rate of the secondary beam was on the order of 100 kHz. The momenta of the proton and the π’s from the decays of the Ξ^−’s and Λ^0 were measured with eight planes of silicon strip detectors arranged in vertical and horizontal views, nine multiwire proportional chambers with wire spacing of 1 mm (C1, C2, and C3) and 2 mm (C4 to C9), and two dipole magnets, M2, which deflected charged particles in the horizontal plane with a total transverse-momentum kick of 1.5 GeV/c. The trigger for detecting the Ξ^− → Λπ^−, Λ → pπ^− decay sequence required no hit in V1 and V2, hits in both S1 and S2, an analog signal from the multiplicity counter M corresponding to at least two but less than five minimum ionizing charged particles and a digital signal from the pion side of C8, C8R, and one from the proton side of C9, C9L. In some portion of the data collection, the fields of the momentum analyzing magnets were reversed, and the trigger sides of C8 and C9 were switched to C8L and C9R to improve our understanding of systematics.

To collect Ξ^+ events, the incident proton intensity was reduced to an average of about 1×10^{10} protons per spill so that the secondary-beam intensity did not vary significantly from the negative mode. The production angles remained unchanged and were cycled between +2.4 and -2.4 mrad. The polarities of M1 and M2 were reversed and there was no change in the triggers. Hence the experiment was CP invariant to first order. This greatly reduced the number of potential sources of systematic bias due to changes in the spectrometer between the Ξ^− and Ξ^+ runs.

In the offline analysis, data taken with the positively and negatively charged secondary beams were processed with the same reconstruction program and subjected to identical event-selection criteria. By imposing geometric and kinematic requirements, events that satisfied the three-track two-vertex topology were searched for. The geometric χ^2 for the topological fit of the selected events was required to be less than 70 for a mean of 30 degrees of freedom. The tracks assigned to be a proton and a pion had to have a pπ invariant mass between 1.108 and 1.124 GeV/c^2. The momentum of the reconstructed Ξ candidate was required to be between 240 GeV/c and 500 GeV/c, and the track had to trace back to within 0.63 cm from the center of the beryllium target in the plane normal to the length of the target. The decay vertex of Ξ was required to be within the fiducial region between the exit of the channel, z = 0.25 m, and z = 23 m. To suppress charged K → 3π background, the event was also reconstructed under the 3π hypothesis. The resulting 3π invariant mass was then required to be greater than 0.51 GeV/c^2. The comparison of the Λπ invariant mass distributions between the Ξ^− and Ξ^+ samples before the final mass selection is shown in Fig. 2. The mass resolution of the Ξ and backgrounds of the samples agreed well. Only events with the Λπ invariant mass between 1.309 GeV/c^2 and 1.333 GeV/c^2 were used for analysis.

Two different methods were applied to measure A_{ΞΛ}. In the first approach, the acceptance that affected the cosθ_{pΛ} distribution given in Eq. (3) was determined with the Hybrid Monte Carlo (HMC) method [21] before the value of α_Ξα_Λ was calculated for the Ξ^− and the Ξ^+ samples separately. For each event, up to 200 HMC events were generated with a uniform distribution in cosθ_{pΛ}, but the rest of the kinematic quantities such as decay vertices and the momentum of the Λ were taken from the data. The event was included in the asymmetry measurement when 10 of the generated HMC events satisified all the requirements in the software that simulated the geometry of the spectrometer and the triggers. Based on about 70,000 Ξ^+ decays α_Ξα_Λ was found to be −0.2894 ± 0.0073. Three independent Ξ^− samples, each with approximately 70,000 events, were selected from a larger pool of events in such a way that the resulting momentum distribution of each Ξ^− sample was identical to that of the Ξ^+. In doing so the difference in the momentum-dependent acceptance between the Ξ^− and Ξ^+ samples was reduced. The values of α_Ξα_Λ for these data sets were determined to be −0.2955 ± 0.0073, −0.3041 ± 0.0073, and −0.2894 ± 0.0073, giving an average of −0.2963 ± 0.0042. As shown in Fig. 3, these results are in good agreement with the world average [22] and were stable with respect to the momentum of the Ξ. This method gave a value of 0.012 ± 0.014 for A_{ΞΛ}. The systematic uncertainty, estimated by varying some of the event- selection requirements, was insignificant.

In the second approach, the difference in α_Ξα_Λ between Ξ^− and Ξ^+ was determined directly without unfolding the acceptance in cosθ_{pΛ}. Two data sets can be compared by defining

R(cosθ_{pΛ}) = ϵ_1(cosθ_{pΛ}) ϵ_2(cosθ_{pΛ}) [1 + (α_Λα_Ξ)_1cosθ_{pΛ}] [1 + (α_Λα_Ξ)_2cosθ_{pΛ}] (5) where R(cosθ_{pΛ}) is the ratio of the probabilities of getting cosθ_{pΛ} in the two samples, and the ϵ’s are the acceptance functions of the cosθ_{pΛ} distributions.

When two sets of Ξ^− events are compared, R is a measure of how well the acceptances agree. Without any corrections, detailed studies showed that the acceptance in cosθ_{pΛ} was strongly dependent on the momentum of the Ξ^−, but was insensitive to the polarization of the Ξ^− or other variations in the experiment, and that R was consistent with unity and independent of cosθ_{pΛ} down to a few × 10^{−3} level [23]. This unique feature is due to the fact that the unit vector p̂_Λ defining the helicity frame changes from event to event over the entire phase space in the rest frame of the Ξ. Any systematic bias due to local inefficiencies of the experiment in the laboratory is mapped into a wide range of cosθ_{pΛ} and thus highly diluted.

In the study of CP symmetry, a sample of Ξ^− events was selected in such a way that the resulting Ξ^− momentum spectrum was identical to that of the Ξ^+ sample. This removed any difference in the momentum spectra due to the different mechanism for producing particles and anti-particles by protons, and ensured that ϵ(cosθ_{pΛ}) was identical for both data sets. In this case, Eq. (5) is simply

R^′(cosθ_{pΛ}) = 1 + α_Λα_Ξcosθ_{pΛ} 1 + α_Λα_Ξcosθ_{pΛ} = 1 + α_Λα_Ξcosθ_{pΛ} 1 + (α_Λα_Ξ − D)cosθ_{pΛ} (6) where α_Λα_Ξ is taken to be −0.2928 [22], and D = α_Λα_Ξ −α_Λα_Ξ can be determined by fitting R^′ as a function of cosθ_{pΛ}. With approximately 70,000 Ξ^− events along with equal number of Ξ^+ decays, the comparison of the momentum and cosθ_{pΛ} distributions of the Ξ samples, and the resulting R^′ are shown in Fig. 4. The θ_{pΛ} distributions agree well, with a χ^2 per degree of freedom of 0.45. D was found to be −0.011 ± 0.009. This implied that A_{ΞΛ} was 0.019 ± 0.015, which was consistent with the result obtained with the HMC method. As a check, another sample of Ξ^− events was picked to repeat the measurement, which yielded a result of 0.008 ± 0.015 for A_{ΞΛ}. Athough this normalization method constituted a powerful cross check for the HMC approach, it suffered from the fact that we had to rely on the measured value of α_Λα_Ξ to determine A_{ΞΛ}. Thus, we preferred to choose the result from the HMC method as our measurement for A_{ΞΛ}.

In summary, we have searched for direct CP violation in non-leptonic decays of charged Ξ and Λ by determining the asymetry parameter A_{ΞΛ}. With approximately 70,000 Ξ^+ and 210,000 Ξ^− decays, we obtained a result of 0.012 ± 0.014 for A_{ΞΛ}. Based on the result of A_Λ = −0.013±0.022 from PS185, we deduced A_Ξ to be 0.025±0.026. Our results are consistent with no CP violation at the 10^{−2} level in the non-leptonic decays of charged Ξ and Λ.

We would like to thank the staffs of Fermilab for their excellent support. This work was supported in part by the National Science Foundation, and the Director, Office of Science, Office of High Energy and Nuclear Physics, of the U.S. Department of Energy under Contract No. DE-AC03-76SF00098.

REFERENCES

a Present Address: Fermilab, Batavia, IL 60510.

b Present Address: Department of Radiology, University of California, San Francisco, CA 94143-0628.

c Present Address: Visa International, 3055 Clearview Way, MS 3A, San Mateo, CA 94402.

d Present Address: Department of Physics, University of Arizona, Tucson, AZ 85721. e Present Address: Department of Physics, Indiana University, Bloomington, IN 47405. [1] J.H. Christenson, J.W. Cronin, V.L. Fitch, and R. Turlay, Phys. Rev. Lett. 13, 138 (1964).

[2] A.D. Sakharov, ZhETF Pis’ma 5, 32 (1967). [3] S. Okubo, Phys. Rev. 109, 984 (1958). [4] A. Pais, Phys. Rev. Lett. 3, 242 (1959). [5] L. Wolfenstein, Phys. Lett. 13, 562 (1964).

[6] L.L. Chau and H.Y. Cheng, Phys. Lett. 131B, 202 (1983). [7] T. Brown, S.F. Tuan, and S. Pakvasa, Phys. Rev. Lett. 51, 1823 (1983). [8] J.F. Donoghue and S. Pakvasa, Phys. Rev. Lett. 55, 162 (1985). [9] J.F. Donoghue, X.G. He and S. Pakvasa, Phys. Rev. D34, 833 (1986). [10] M.J. Iqbal and G.A. Miller, Phys. Rev. D41, 2817 (1990). [11] X.G. He, H. Steger and G. Valencia, Phys. Lett. B272, 411 (1991). [12] X.G. He and G. Valencia, Phys. Rev. D52, 5257 (1995). [13] D. Chang, X.G. He, and S. Pakvasa, Phys. Rev. Lett. 74, 3927 (1995).

[14] X.G. He, H. Murayama, S. Pakvasa, and G. Valencia, Phys. Rev. D61, 071701 (2000). [15] M. Lu, M. B. Wise, and M. J. Savage, Phys. Lett. B337, 133 (1994); A. Datta, and S.

Pakvasa, Phys. Lett. B344, 430 (1995); A.N. Kamal, Phys. Rev. D58, 077501 (1998). [16] P. Chauvat et al., Phys. Lett. B163, 273 (1985). [17] M.H. Tixier et al., Phys. Lett. 212, 523 (1988). [18] P.D. Barnes et al., Phys. Rev. C54, 1877 (1996).

[19] T.D. Lee and C.N. Yang, Phys. Rev. 108, 1615 (1957); M. Aguilar-Benitez et al., Phys.

Lett. B170, 154 (1986).

[20] P.M. Ho et al., Phys. Rev. D44, 3402 (1991).

[21] G. Bunce, Nucl. Instrum. Meth. 172, 553 (1980); R. Rameika et al., Phys. Rev. D33, 3172 (1986).

[22] C. Caso et al., Euro. Phys. J. C3, 1 (1998).

[23] J. Antos et al., Fermilab Proposal 871 (revised), March 26, 1994.

FIGURES

FIG. 1. Plan view of the E756 spectrometer (not to scale). The x dimensions of the silicon strip detectors and C9 are 3 cm and 1.2 m respectively. C9 is located at 62.3 m from the exit of the collimator through M1.

FIG. 2. Distributions of Λπ invariant mass with all event-selection requirements applied except the cut on Λπ invariant mass. Events between the arrows were used for analysis.

FIG. 3. Results on α_Ξα_Λ as a function of the momentum of the Ξ. The shaded area is a one-standard-deviation band centered at the world average.

FIG. 4. Comparison of Ξ^+ and Ξ^− events after the momentum distributions are normalized. The momentum distributions are shown in (a). The cosθ_{pΛ} distributions are shown in (b). R^′ as a function of cosθ_{pΛ} is shown in (c).