arXiv:hep-ph/0405028v1 4 May 2004

2.05.2004 WIC/12/04-MAY-DPP

A New Technique for Finding the Underlying Model Parameters in GMSB.

Ehud Duchovni^1 and Peter Renkel^2

Particle Physics Department, Weizmann Institute of Science, Rehovot 76100, Israel

Abstract

A new, model dependent way of uncovering some of the values of the underlying GMSB parameters is proposed. This method is faster than the existing procedures and once enough luminosity is available, can be used to check the consistency of the model.

1ehud.duchovni@weizmann.ac.il 2Renkel@wisemail.weizmann.ac.il

1 Introduction

This note assumes that after a short run at LHC one will find out that nature is supersymmetric and follows the Gauge-Mediated SuperSymmetry Breaking (GMSB) scheme. At that point one will face the task of uncovering the value of the underlying model parameters. In the simplified version of such a model 6 such parameters exist [1], namely: Λ, M, T anβ, N, sign(μ), κ For simplicity sake it is assumed here that N=1. This assumption gives rise to the lightest possible mass spectrum of SUSY particles for a given M and Λ. The case of N > 1 will be discussed in a future note.

The value of M has marginal effect on the phenomenology which will be discussed below because it enters only through the logarithmic running of the masses in the renormalization group equations, and will therefore, be ignored hereafter. The sign of μ has also a small effect and will be only briefly treated. κ controls the way in which the LSP, namely the Gravitino couples to the other particles, in particular to the NLSP. It is assumed here to be small. In case it is large it will be determined by measuring the lifetime of the NLSP. The value of Λ will be determined directly from the production cross section of SUSY events (Figure 1) and due to its triviality will not be further discussed here.

The parameter which is at the focus of the present study is tanβ . tanβ is traditionally [2] determined using the mass of the Higgs boson and to a lesser extent by the mass of the 3rd generation sparticles. However, if nature is indeed supersymmetric, the Higgs boson mass is expected to be at most 130 GeV. In this mass range the discovery and the mass determination of the Higgs boson require relatively high luminosity (the cross-section times branching ratio of a 130 GeV Higgs boson to a ZZ^∗ and later to a 4-lepton final state is only ≈ 3fb). Mass reconstruction is also a non-trivial task. Only a small fraction of the produced events are suitable for mass reconstruction. Consequently one will be able to determine tanβ with a reasonable accuracy only after collecting a significant amount of data.

The method which is proposed in the present study is based on the fact that the mass of the τ̃ lepton depends on the value of tanβ. For low tanβ the τ̃ lepton is relatively

Figure 1: Total SUSY cross-section as a function of Λ value.

heavy^3 and it decays into the NLSP, namely to the χ^0_1. For high values of tanβ the τ̃ lepton becomes lighter and eventually it becomes the NLSP (Figure 2). This change in the τ̃ lepton mass leads to a change in the average number of τ̃ leptons in SUSY events. The τ̃ lepton decay gives rise to a final state that contains a τ lepton. Hence, it is argued here that one does not need to reconstruct and measure the mass of the τ̃ lepton, rather, one can determine tanβ by simply counting the number of τ leptons as well as electrons and muons in SUSY events.

2 Description of the technique

One may divide the relevant tanβ interval into 3 distinctive regions. The first one, the low tanβ region, is characterized by a light χ^0_1 (whose mass is independent of tanβ) which is the NLSP and a relatively heavy τ̃ lepton (whose mass depends on tanβ). In this region one expects to see a large number of isolated energetic photons which are the result of the only possible χ^0_1 decay mode, namely, χ^0_1 → γG̃. One would also expect to see relatively sizable number of isolated energetic τ leptons. These τ leptons can originate from two main sources: the decay τ̃ → χ^0_1τ which gives rise to relatively

3since only the τ̃_1 lepton is relevant in the present study the subscript ’1’ was omitted.

Figure 2: Mass dependence on tanβ. The solid black line represents the mass of the χ^0_1 , the dotted red line that of the τ̃ lepton, the dashed-dotted green line represents the mass of the ẽ_R and μ̃_R which are degenerated, the dashed blue line that of the χ^±_1 , the upper solid light blue line is for the χ^0_2 and the brown dashed-dotted line represents the mass of the τ̃_2. The masses here are plotted for the case of Λ = 75 T eV , M=250 TeV and positive μ.

soft τ leptons due to the small τ̃ − χ^0_1 mass difference, and the decay χ^0_2 → τ̃τ which gives rise to a harder spectrum of τ leptons. The low tanβ region extends over a very large region of tanβ and the determination of the value of tanβ inside this region will be the main issue of this study.

The other extreme case: the high tanβ region, is characterized by a light τ̃ lepton which is the NLSP and a somewhat heavier χ^0_1. In this region one expects to see a large number of isolated energetic τ leptons and no isolated energetic photons. Here one would have an additional source for hard τ leptons, namely, the τ̃ → τG̃ decay. This region, in principle, can extend up to tanβ of about 50. However, for moderate values of Λ the mass of the τ̃ lepton drops, for high tanβ, below the LEP limit [3] of 86.9 GeV. Consequently, the range of tanβ covered by this region is quite limited. The intermediate region is the region in which the mass difference between the τ̃ lepton and the χ^0_1 is smaller than the mass of the τ lepton and one cannot decay to the other. In this region both the number of isolated photons and τ leptons are ’frozen’. For the case in hand of Λ = 75 TeV this happens for tanβ between 32.8 and 34.6.

The main features of the events, namely the average number of isolated energetic photons and τ leptons as a function of tanβ is shown in Figure 3 for a machine luminosity of 1 fb^{−1}, Λ = 75 T eV and M = 250 T eV . The number of τ leptons in the figure is computed after applying a p_t cut of 15 GeV on visible τ lepton decay products and without any detector simulation. These results show that by a simple photon and τ leptons counting experiment one will, in principle, be able to determine which is the relevant region of tanβ: In the low tanβ one would see a large number of photons and a sizable amount of τ leptons. In the intermediate region the number of photons will drop significantly but one will still be able to see a few hundred photons per fb^{−1}. One will see, in addition, a large number of τ leptons. In the high tanβ region one will observe a very large number of τ leptons and no isolated photons coming from χ^0_1 .

As mentioned above, the low tanβ region extends for Λ=75 TeV and positive μ from tanβ ≈ 2 till tanβ ≈ 32.7. This is a very large region and one would like to be able to determine tanβ inside this region. The number of photons is absolutely flat and offers no clue for tanβ determination, but the number of τ leptons shows some dependence on tanβ and a measurement of N_τ will allow one to determine tanβ value inside this region. The number of τ leptons increases initially as tanβ increases since heavy gauginos prefer decaying into τ̃ due to the drop in its mass compared to the

Figure 3: The expected average number of isolated energetic photons and τ leptons as a function of tanβ . The number of τ leptons is shown after applying a p_t cut of 15 GeV (full black curve) on its visible decay products (no detector simulation). The number of photons (blue dotted) was computed with the same p_t cut. The numbers were computed assuming luminosity of 1 fb^{−1}, Λ = 75 T eV , M = 250 T eV and positive μ.

mass of the other slepton. This effect is then balanced and overcome by the effect of the p_t cut of the τ lepton, as the resulting τ leptons at high tanβ values are softer due to the smaller mass difference between the τ̃ and the χ^0_1. The resulting shape of the N_τ curve shows that the determination of tanβ in this way will suffer from a lowhigh ambiguity. One may exploit the τ lepton momentum distribution to resolve this ambiguity but a higher sensitivity to tanβ can be achieved by counting the number of light leptons, namely, electrons and muons which is shown in Figure 4. At low values of tanβ the τ̃ lepton is relatively heavy and consequently its production in gaugino decays is as likely as the production of light leptons. At higher values of tanβ the τ̃ lepton becomes lighter and its production in those decay is preferred. As a result the number of prompt light leptons (not from τ lepton decay) is dropping. This is clearly shown in Figure 4.

3 Results Using Fast Simulation

The fast Atlas detector simulation program was used in order to estimate the sensitivity of the procedure which was outlined above under semi-realistic conditions. In addition to the expected degradation of the sensitivity due to detector simulation the effects of possible background sources were also taken into account. Signal events were simulated using the Isajet [4] MC program. QCD, W^± and W^±+jets, Z^0 and Z^0+jets as well as tt̄ events were also simulated using Isajet and the same detector simulation program. The isolation of SUSY events was based on the presence of isolated photons in the final state, namely on two simple requirements:

1. at least one isolated photon^4 with p_t > 15 GeV ; 2. E^{miss}_T > 100 GeV . these simple cuts reduced the SM background to a negligible level. The hadronic τ leptons are identified using the Weizmann algorithm [5]. In this algorithm one starts with jets. A jet is accepted as a τ if it fulfills the following requirements:

1. there is 1 charged track with p_{T track} > 5 GeV in a cone ΔR < 0.07, ΔR = √ Δϕ^2 + Δη^2, around the jet axis;

4an isolated photon is defined as an electromagnetic cluster with E_t > 15GeV in |η| < 2.5 range, separated from the closest jet by ΔR > 0.4 and from the closest lepton by ΔR > 0.15 and surrounded by a ΔR > 0.2 cone in which less than 10 GeV were recorded in the calorimeter.

Figure 4: The dependence of the number of light leptons (electrons and muons) on the value of tanβ. The black (dashed) curve is for the total number of lepton and at high values of tanβ is dominated by leptons coming from τ lepton decays. The blue (solid) curve represents the leptons that do not come from τ lepton decays (mostly from slepton and gaugino decays). The plot is done with equivalent luminosity of 1 fb^{−1}.

2. an isolation fraction, i.e. fraction of transverse energy in a ring 0.2 < ΔR < 0.4 around the jet axis, is smaller than 0.1;

3. p_T of the jet (non-calibrated) is greater then 15 GeV;

4. number of the hit cells within a jet cone of ΔR < 0.4 is smaller than six.

The number of identified τ leptons and light leptons is shown in Figure 5 for a luminosity of 4 fb^{−1} for the case of positive μ (a) and negative μ (b). The drop in the number of leptons at low values of tanβ for the negative μ case results from the rise in the χ^0_2 and χ^±_1 mass in this region, which is absent in the μ > 0 case. By simply counting the number of τ leptons and light leptons one can extract the value of tanβ with a small statistical error as shown in Figures 6 and 7, in which the error on the reconstructed tanβ is shown as a function of the input value of tanβ (statistical errors only). One can also see that the number of light leptons differs significantly between the positive and negative μ scenarios as long as tanβ < 15. Hence, light lepton counting will allow a determination of the sign of μ in this region. Finally, the error on tanβ was evaluated using the present procedure under the conditions specified in [2], namely, a luminosity of 10fb^{−1}, M=500 TeV and Λ= 90 TeV. The evaluation of the value of tanβ in two independent ways will provide an important consistency check. The performance of both methods is compared in Figure 8 with the attainable performance based on mass reconstruction and the present method is shown to perform much better.

4 Systematics

Simple particle counting is sensitive to uncertainties in the luminosity measurement as well as to the uncertainties of the identification efficiency and purity of the relevant counted object. The uncertainty in the determination of the luminosity might be fairly large and might lead to large systematic error in the determination of tanβ . However, since the proposed procedure is valid in the framework of a given model which gives rise to a constant number of photons which does not depend on the value of tanβ , one would be able to replace the uncertainty on the luminosity by the statistical error on the number of observed photons, which is expected to be small due to the abundance of photons. This ’photon-recalibration’ will render the luminosity error negligible.

Figure 5: The number of expected τ leptons (dotted black curve) and light leptons (red solid curve) for different values of tanβ as predicted using fast simulation for a a luminosity of 4 fb^{−1}. A cut of p_t > 15 GeV visible transverse momentum of the τ lepton and light leptons has been applied. a) is drawn for the positive μ scenario and b) for the negative case.

Figure 6: The final attainable accuracy on tanβ determination for various possible tanβ values. The errors are statistical only and evaluated for luminosity of 4 fb^{−1}. The plot is done for the μ > 0 case. The shaded light-blue region represents the final result. Note that no ambiguity is left.

Figure 7: The final attainable accuracy on tanβ determination for various possible tanβ values. The errors are statistical only and evaluated for luminosity of 4 fb^{−1}. The plot is done for the μ < 0 case. Note that no ambiguity is left.

Figure 8: A comparison between the present procedure (yellow band) and the one based on mass reconstruction [2] (red arrow bar at tanβ=5). The present procedure gives a much lower error (±0.25 compared to ±1.3) for the same luminosity (10 fb^{−1}.)

Figure 9: Effect of 1% systematic error on both the detection efficiency of light and τ leptons. Comparing the uncertainty in this plot, which is done for positive μ with Figure 6 shows the relatively small effect of such systematic uncertainty.

The identification efficiency of electrons, muons and τ leptons and the purity of these samples should be understood, once ≈ 1fb^{−1} has been collected, at a level of 1% or better. This can be done by studying the large number of Z^0 and other SM processes. In order to evaluate the sensitivity of the present proposed procedure to identification uncertainties a 1% shift in both light and τ lepton identification was introduced and the value of tanβ was recomputed and is shown in Figure 9. As can be seen by comparing this to the result shown in Figure 6 in which no systematic error is introduce, the effect of 1% systematic error in the identification efficiency is quite limited.

5 Conclusion

A simple electron, muon and τ leptons as well as photons counting is shown to provide a fairly accurate determination of tanβ in N=1 SUSY GMSB case. The proposed technique does not depend on the measurement of the Higgs boson or τ̃ mass and hence, can be carried out with low luminosity, well before the Higgs boson mass can be measured. The attainable accuracy is significantly better than the one obtained by the conventional way [2] of using Higgs boson mass and by explicitly reconstructing the τ̃ lepton.

References

[1] e.g. S. Dimopoulos, S. Thomas and J. D. Wells, Nucl.Phys.B488:39-91,1997 , hep-ph/9609434.

[2] ATLAS TDR, CERN LHCC/99-14 vol II.

[3] LEP SUSY working group web-page:

http://lepsusy.web.cern.ch/lepsusy/www/gmsb_summer02/lepgmsb.html

[4] ISAJET 7.69 A Monte-Carlo Event Generator, Frank E. Paige, Serban D. Protopopescu, Howard Baer and Xerxes Tata, hep-ph/0312045

[5] E. Gross and L. Zivkovic, note in preparation.