arXiv:nucl-ex/0201004v1 9 Jan 2002

Precise validation of neutron cross section data bases using a lead slowing down spectrometer and simulation from 0.1 eV to 40 keV.

Methodology and data on thin and thick targets and data bases adjustement

L.Perrot, A.Billebaud, R.Brissot, A.Giorni, D.Heuer, J.-M.Loiseaux, O.Méplan, and J.-B.Viano Institut des Sciences Nucléaires, IN2P3-CNRS/UJF 53, av. des Martyrs, 38026 Grenoble Cedex France

December 23, 2017

Abstract

Research on accelerator driven systems (ADS), related new fuels and their ability for nuclear waste incineration has led to a revival of interest in nuclear cross sections of many nuclides over a large energy range. Discrepancies observed between nuclear data bases require new measurements in several cases. A complete measurement of such cross sections including resonance resolution consists of an extensive beam time experiment associated to a long process of analysis ans validation. With a slowing down spectrometer associated to a pulsed neutron source, it is possible to determine good cross section profile in an energy range from 0.1 eV to 40 keV. These measurements performed at ISN (Grenoble) with neutron source GENEPI requires only small quantities of matter (as small as 0.1 g) and about one day of beam per target.

We present measured cross section profiles and an experimental study of self-shielding effect. A CeF_3 scintillator coupled with a photomultiplier detects gamma rays from neutron capture in the studied target. The neutron flux is also measured with a^{233}U fission detector and a^3He detector placed symmetrically to the PM in relation to the neutron source. Absolute flux values are given by activation of Au and W foils. Test of slowing down properties is done with a precision of 1% The cross section profiles can then be deduced from the target capture rate and are compared with very detailed MCNP code simulations, which reproduce the experimental set-up and provide also capture rates and neutron flux. A good agreement between experimental and simulated profiles for well-known cross sections like Au for different thicknesses is found in our energy range, and therefore validates the method and the taking into account of self-shielding.

The method is then applied to^{232}Th which is of main interest for new fuel cycle studies, and is complementary to higher energy measurements made by Karamanis et al. [1]. Results obtained for three target thicknesses will be compared with the simulations based on different data bases. Special attention will be paid to unresolved resonances region (E> 100 eV).

Contents

1 The lead slowing down spectrometer (LSDS) and principal properties 3 1.1 Physics . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 3 1.2 Description of the facility . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 4 1.3 The neutron source . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 4

2 Experimental and simulation methodology 4 2.1 The observables . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 4 2.1.1 E-t correlation and absolute neutron flux energy variation measurements . . . 5 2.1.2 (n,γ) reaction rate for samples . . . . . . . . . . . . . . . . . . . . . . . . . . 6 2.2 The associated detectors and acquisition . . . . . . . . . . . . . . . . . . . . . . . . . 6 2.2.1 Neutron source monitoring . . . . . . . . . . . . . . . . . . . . . . . . . . . . 6 2.2.2^3He detector for relative normalization . . . . . . . . . . . . . . . . . . . . . . 6 2.2.3^{233}U detector and activation for neutron flux measurements . . . . . . . . . . 7 2.2.4 (n,γ) detector . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 7 2.2.5 Acquisition . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 7 2.3 Simulation . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 8 2.4 Data processing, background substraction and comparison methodology for (n,γ) . . 8

3 E-T correlation and flux measurements 9 3.1 The time-energy relation in the lead block . . . . . . . . . . . . . . . . . . . . . . . . 9 3.2 Flux measurements . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 9 3.2.1 Measurements with^3He counter . . . . . . . . . . . . . . . . . . . . . . . . . 9 3.2.2 Absolute neutron flux . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 10 3.2.3 Capture rate in Au . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 11 3.3 Conclusions about the flux . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 11

4 Capture results 11 4.1 Thin an thick Au targets for simulation validation . . . . . . . . . . . . . . . . . . . 12 4.2 Experimental and simulation data on (n,γ) reaction rates on various samples . . . . 12 4.2.1 Tantalum . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 12 4.2.2 Indium . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 13 4.2.3 Thorium . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 13 4.2.4 Silver . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 13 4.2.5 Technetium . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 14 4.2.6 Manganese . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 14 4.2.7 Naturel Nickel . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 15

Introduction

Waste incineration, durable nuclear energy production with new fuels, new coolant and structural materials, some discrepancies or lack of precision of the nuclear data bases bring clearly new needs in terms of experimental validation of cross-sections and associated deviation.

Using a Lead slowing down spectrometer coupled to a specially designed pulsed neutron generator and new types of detectors with modern data acquisition system, it will be shown that very precise experiment performed on (n,γ) or (n,f) cross-section leads to validation of cross-section energy profile within 5% error. In addition, with the same experimental equipment, we present also a precise check of the Lead medium transport properties (slowing from 14 MeV down to 0.2 eV, elastic and capture cross-section between 40 keV and 0.2 eV).

On the other hand it is demonstrated that the Monte-Carlo Code MCNP is able to predict precisely reaction rates.

The very careful analysis of both experimental and simulation results should allow a precise validation or invalidation of neutron cross section over a large energy range.

The present paper is going to show a few significant examples where clearly some neutron cross sections are inadequate to describe reaction rate, while some others do it with a relative precision of 5% over more than 5 orders of magnitude in energy (from 40 keV to 0.2 eV).

In addition, experimental and simulation data have been precisely obtained for thin and thick targets, which demonstrates the validity of cross section data for describing important self-shielding effects, in large resonances as well as in the unresolved resonance region.

The general methodology is described in some details and tends to show that this method can be very useful in test and validation of data bases for neutron cross sections and is able to propose the best choice between data bases as long as an energy dependent adjustement of these is needed.

1 The lead slowing down spectrometer (LSDS) and principal properties

1.1 Physics

In a lead medium, the average neutron velocity change between two elastic collisions is approximately constant: Δv v = α = m_{Pb} × m_n (m_{Pb} + m_n)^2 (1) m_{Pb} and m_n are respectively the Lead nucleus and neutron masses ; this leads to a correlation between the time t at which a neutron is observed and its velocity v [2, 3, 5, 4, 6]: t = (1 − α)λ_s α ( 1 v − 1 v_0 ) (2) where the mean free path λ_s ≈ 2.76 cm in the Lead is approximately constant and v_0 is the initial neutron velocity. This correlation could be rewritten in a slightly different way, using the time and the neutron kinetic energy E: E = K (t + t_0)^2 (3) where K =^{mnλ2s (1−α)2}_{2α2} and t_0 =^{(1−α)λs}_α √_{mn} 2E_0

1. The time t_0 could be understood as a correction to the fact that neutron is not created at infinite energy but at E_0 (14 MeV for the tritium target). In practice, inelastic scattering on lead is predominant for high energy neutrons, thus this parameter will be a phenomenological constant that we have determined by a detailed Monte Carlo simulation.

The relation (3) will be very help-full to determine the energy of the detected neutron, measuring the laps of time between the start of the beam pulse and the time of neutron interaction in the detector.

The energy–time relation is not a one-to-one function but a mean value of a correlation. This correlation has been studied in detail in the TARC experiment [6] and the same kind of analysis has been done here.

1.2 Description of the facility

The slowing down time spectrometer is a cubic assembly of 46.5 tons of pure lead (99.99%): it consists of 8 blocks of 80 × 80 × 80 cm^3. A central channel permit the insertion of the glove finger of the accelerator ended by the target (described in the following section) up to the middle of the spectrometer (mechanical sketch can be seen in figure ??). Each block has two channels (10×10 cm^2 in section) parallel to the beam axis, which are used both for handling the block and detector insertion. With lead bricks they can be reduced to 5×5 cm^2 in the case of detector insertion. Pure lead was chosen to ensure that impurities, principally Silver, Bismuth, Cadmium, Copper, Antimony and Tellurium are less than 5 ppm and have thus negligible effect on the neutron flux. The lead block is shielded with a Cadmium foil to capture neutrons that escape from the block and are backscattered by concrete walls, and may perturb the time-energy correlation. A simulation shows that the principal contribution of backscattered neutrons comes from the support of the Lead block.

1.3 The neutron source

The neutron source coupled with the spectrometer is a pulsed source especially designed for neutronic experiments carried out either with LSDS or in the nuclear reactor MASURCA at the CEA Cadarache Center (France). Operating in a sub-critical reactor or in a LSDS, the pulse intensity must as big as possible. The GENEPI (GEnerateur de NEutron Pulsé Intense) consists in a duoplasmatron source producing fast deuteron pulses of less than 1 μs. This pulse duration corresponds to few neutron lifetimes in subcritical reactor and to the slowing down time necessary for a 14 MeV neutron to reach 100 keV. The repetition rate of the source can vary from a few Hz up to 5 kHz. The deuterons are accelerated to the maximal energy of 250 keV, with a maximum peak intensity of 50 mA. They are then focused through a five meter long tube (glove finger) onto a deuterium or tritium Titanium target. The nuclear reactions D(d,n)^3He or T(d,n)^4He produce neutrons with energy 2.67 MeV and 14 MeV respectively. With a tritium target the source can produce typically 5.10^6 neutrons per pulse in 4π.

2 Experimental and simulation methodology

2.1 The observables

1Sometimes, this relation is expressed with the average lethargy change which is ξ ∼ 2^α_{1−α}

2.1.1 E-t correlation and absolute neutron flux energy variation measurements The E-t correlation and absolute flux energy variation measurements allow to have precise check of σ_{el}(E), σ_{(n,γ)}(E) in Lead, as well as energy variation of Φ(E< 40keV) per source neutron. The 14 MeV neutrons delivered by the generator are slowed down below 800 keV mainly by (n,2n) reactions followed by inelastic scattering on different Lead isotopes in less than a few 10^{−7} second.

Then the only slowing down process is the elastic scattering. For isotropic elastic scattering, the relation (2) can be rewritten (assuming initial energy of the neutron is E_0, and energy at time t is E) t = 1 − α α λ_s(E) (√ m_n 2E − √ m_n 2E_0 ) (4) where λ_s(E) =^1_{N Pbat/cm3 σPbel (E)} .

From relation (4), it appears that the slowing down time is directly related to elastic cross section absolute value behaviour between E_0 and E_f . Measuring this slowing down time between 40 keV and 0.2 eV povides a good test of σ_{el} behaviour through relation (4). We may also point out that if ⟨σ_{el}⟩ has only a smooth energy variation, as it is the case of lead, a large part of the slowing down time (68%) is spent to go from E = 10E_f to E_f , which means that the mean level of ⟨σ_{el}⟩ can be tested from 2 keV down to 0.2 eV. This slowing down time can be measured with a precision of 2%, giving a validation of σ_{el} in the few percent range, at least for t > 10 μs (E < 1.7 keV ). Moreover the time dispersion observed from well known capture resonances for going from E_0 to E_f is also a good test of the simulation code.

We will show in the section 3.1 how this precise energy time correlation is sensitive to elastic scattering.

The neutron flux energy variation can be precisely measured via the time variation of reaction rate ϕ(t, E)σ(E) over 0.2 eV up to 40 keV if σ(E) is well determined.

To measure ϕ(t(E)), we used two kind of detectors (described below) based on two well known cross section (σ^{3 He}_{(n,p)} and σ^{Au}_{(n,γ)}) in the above energy range.

Such precise measurement is sensitive to σ^{P b}_{el} (E) and σ^{P b}_{(n,γ)}(E) behaviour. Namely in a given range of energy an over-evaluation of σ_{el} will be observed as a flux under-predicted as shown in [7]. The (n,γ) absorption in Lead is also tested through ϕ(E) variation since relation (4) can be used to evaluate the flux attenuation in the case of σ_{el} = Cte and σ_{(n,γ)}(E) =^A_v . Within these assumption, ϕ(t(E)) is attenuated through (n,γ) process by an attenuation factor which writes as e^{−βt} where β = f(A, σ_{el}). The associated precision on the Lead (n,γ) cross section absolute value will be estimated in section 3.2.

Absolute flux measurement and absolute calibration of the neutron source have been performed. The experimental method will be described in sections 2.2.1 and 2.2.3. The measurement of absolute flux in the energy range 0.2 eV to 40 keV for a measured number of source neutrons gives the quantity Φ(E< 40keV) per 14 MeV source neutron which can be compared directly with simulation data. These absolute measurements allow the test of the transfer function for the neutron from 14 MeV down to 40 keV, transfer function which is sensitive to elastic or inelastic scattering,(n,2n), and (n,γ) reactions in Lead.

2.1.2 (n,γ) reaction rate for samples Energy correlation in a lead block is characterised by an approximate equation (??) which writes as E(keV ) = K(keV/μs^2) (t(μs) + t_0(μs))^2 (5) and a dispersion of time for a given energy of about 20%.

When measuring at time t, reaction rate ϕσ_{(n,γ)} on a small sample of material in the LSDS, the measurement is sensitive to the actual mean flux in the sample volume. The mean flux is first sensitive to the slowing down process in Lead up to the time t, and also to the average flux in the sample. Even with relatively thin foils, due to very large (n,γ) cross sections in resonances, self shielding effect has to be taken into account. In order to test precisely the description of these effects by the simulation codes we have made measurements on samples of different thicknesses (from 100 μm up to a few millimeters). Finally, if the energy variation of flux is well described and precisely validated by flux measurements, then the ϕσ_{(n,γ)} reactions will permit to validate cross section data bases, or to indicate the amplitude of deviations in some energy range.

2.2 The associated detectors and acquisition 2.2.1 Neutron source monitoring The monitoring of the source was made by detection of the associated particle of the neutron producing reaction: alpha in the case of T(d,n)^4He reaction, proton in the case of D(d,p)T reaction which occurs about as often as the D(d,n)^3He reaction. For 0^∘ neutrons the associated particle is emitted in the opposite direction and goes upstream the incident deuteron beam, suffering focalization in the glove finger and being bent in the GENEPI magnet chamber (having both the same mangnetic rigidity) to finally impige one of the two silicon detectors placed side by side in the vacuum of this chamber. One detects alpha and proton while the other, covered with a 10μm Aluminium foil, detects only protons. The detection of alpha relatively to protons gives the 14 MeV neutron source relatively to the 2.5 MeV source which appears because of deuteron ion implantation in the target. The ratio of these two sources was typically equal to 50.

2.2.2^3He detector for relative normalization A classical^3He proportional counter has been used for neutron flux monitoring. This detector belongs to a serie of counters especially designed for neutron flux spectroscopy in a fast sub-critical reactor. They have to fit special geometrical and efficiency requirements and therefore are built and filled at ISN. The gas filling of the detector used during this experiment is 70 mbars of^3He, 6 bars of Argon and a few mbars of CO_2 (as quenching gas). Its detection effective zone is a cylinder of 6 cm long and 2 cm in diameter. This counter has been placed in a channel symmetrical to the capture rate counting device in relation to the beam axis, and has remained at the same place during all the measurements. Its counting rate above a constant threshold was used for neutron spectrum normalization.

Time spectra have also been performed with this detector to obtain neutron flux as it will be shown in section 3.2.2.

2.2.3^{233}U detector and activation for neutron flux measurements A^{233}U target facing a silicium detector placed in a small Lead box was used to measure the neutron flux. This target consists in a 1 cm^2 deposit of 200 μg/cm^2 of^{233}U on a 100 μm Aluminium foil. It is collimated to 0.85 cm in diameter. The fission fragments were detected in the silicium as well as the alpha particle (beam off) for a self-calibration of the detector. Flux has been measured at a symmetrical position to the (n,γ) measurements in relation to the beam axis. For absolute flux measurements Nickel targets have been irradiated at different places in the Lead block. With the Tritium neutron source the two reactions exploited are^{58}Ni(n,2n)^{57}Ni, and 58Ni(n,np)^{57}Co. These reactions having a threshold around 13 MeV, they allowed to study the propagation of the 14 MeV source neutrons in the block.

2.2.4 (n,γ) detector Capture reaction rates have been measured with a small photomultiplier Philips XP1911 of 18.6 mm in diameter. A teflon embase has been especially built for these measurements in order to avoid Hydrogen. Decoupling capacitors have been modified to allow a decay constant long enough compared to the time between two pulses. A CeF_3 scintillator with a 30 ns time constant was coupled to the PM: this material has been chosen for its low capture cross section. The only contribution of Hydrogen is coming from the adhesive surrounding the PM: despite it is supposed to be Hydrogen free there is a residual proportion. The use of a Lead box where the PM and the target are embeded ensured the reproducibility of the capture measurements.

A LED was coupled to the scintillator in order to measure the PM gain variation. This variation has been measured less than 4% in the energy range 0.1 eV to 50 keV, insuring the good reproducibility of the measurements.

We have made a systematic determination of the average position of the collected gamma pulse distribution for each sample. For each element we obtained this position as a function of neutron energy. We have seen that whatever the sample studied, this position varies only within 5% in the energy range 0.1 eV-30 keV. In this energy range neutronic capture happens mainly in the L=0 angular momentum state, which means it seems reasonable to think that the detector efficiency does not depend on neutron energy. We will see in section 4.1 and 4.2 the good agreement between simulated and experimental reaction rates in the 0.1 eV and 30 keV energy range. Apart from the discrepancies due to cross section description, we observe an agreement better than 5%. This indicates strongly that the gamma detection efficiency does not vary more than 5% in this range and with the chosen experimental conditions.

2.2.5 Acquisition Detector signals are coded with an ADC designed at ISN and providing also time referenced to the neutron pulse for each event. The sampling time, which can be as low as 25 ns, is here chosen to 100 ns. To avoid dead time mainly due to analogic coding (6.2 μs), an electronic veto was used to suppress counting during the intense source pulse. With the same aim beam intensity has been adjusted to have less than 0.1 count per pulse measured by the PM over the first 10 μs after the pulse, this region defining the high energy limit of this measurement.

2.3 Simulation

Simulations are made with the MCNP (Monte Carlo N-Particles) code. This Monte Carlo transport code has been developped at Los Alamos Laboratory by John Hendricks, Judith Briesmeister et al. [8].We use here MCNP-4B version, exploiting only the neutron transport module. With this code it is possible to make a very precise description of the experimental set-up geometry: concrete experimental hall, GENEPI glove finger, lead block, detectors, as it can be seen in figure ??. The neutron source due to T(d,n)^4He reactions has been described using data from [9]. Simulations depend on two main effects. First, materials composing each item given by constructors, for instance lead impurities which exact proportions are not quite well known, can have high absorption resonances on neutron flux (see section 2.4). Hydrogen proportion in adhesive and glue surrounding the PM, and thus very close to the target studied, is also of major importance. Elastic collision of a neutron on hydrogen leads to a mean energy loss of half of its energy and therefore the neutron does not follow the time energy correlation law any more. It brings an increase the reaction rate for short detection times and induces a filling up of the spectra between the resonances (figure ??). Nuclear Magnetic Resonance measurements have been necessary to know precisely the hydrogen proportion in adhesive and modify the associated material description in the simulations. The other main contribution in simulations is the choice of the data base used for the materials the most significant on neutron transport. We will see in section 3 that we have settled on JENDL3.2 data base for Lead.

Then for a fixed geometry and composition the only free parameter for the targets of interest is the data base used.

Calculated reaction rates versus time are made up to 3 ms, and their time bining is chosen the same than the experimental one, i.e. 100 ns.

2.4 Data processing, background substraction and comparison methodology for (n,γ)

A specific procedure has been developped to extract capture rates measured by the photomultiplier. This method is applied to all the targets, radioactive or not, thick or thin. Constant levels are first of all substracted from the background and the sample time spectra. These levels are determined by fitting the spectra at times greater than 4 ms. They are associated to the activation of surrounding materials such as scintillator, PM, Lead, impurities, to the possible activation of the target itself, and sometimes to the intrinsic activity of the target. Secondly, corrections must be applied to the background spectrum to take into account effects appearing only when the sample to be studied is in front of the scintillator. They are of two types: γ-rays emitted by various materials contributing to the background can be damped, and the neutron flux can be also locally damped because of the presence of the target. Then the corrected background can be subtracted to the sample spectrum and the normalized capture rate spectrum is obtained.

Simulated reaction rates as a function of time calculated for δ neutron injections are folded by the GENEPI pulse shape. They are normalized to the same number of neutrons than the experimental spectra (themselves normalized by the counting of the^3He monitor).

For the background spectrum which is of first importance, it has been necessary to investigate every spectrum structures and the associated component proportions surrounding the target. This analysis has led to a background reconstruction whose results are shown in table 1 and in figure ??.

By applying the E-t relation (4) to the simulated and experimental spectra, reaction rates per monitor neutron versus energy are obtained. This presentation will be adopted to simplify the understanding of the spectra.

3 E-T correlation and flux measurements

3.1 The time-energy relation in the lead block

As we have seen in section 1.1 and 2.1, the neutron slowing down time in the lead is related to its kinetic energy through the relation E =^K_{(T +t0 )2} . We have also shown that the parameter K was depending on the elastic cross section of Lead. In figure ?? we show the variation of this parameter deduced from the neutron flux simulation versus energy and time, respectively by use of ENDF/B-VI and JENDL3.2 base for Lead. We can deduce this parameter experimentally for a precise resonance energy of several samples like Au, In, and Mo.

First of all we can notice that K is not independant on the neutron energy. This parameter is sensitive to the diffusion cross section. From the relation (??) we can deduce^{ΔK}_K =^{2Δσel}_{σel} . At 100 eV, a difference of 1.2% exists between elastic cross sections of the two data bases, and it leads to a 2.4% differnce on the associated K values. We observe also below 1 eV that K values increase whatever the data base chosen. This increase is caused by two reasons. First of all, the part of neutrons escaped from the Lead block but going back into it becomes non negligeable below 5 eV: we can notice that, though they are correlated in time and energy, they need more time to reach the kinetic energy they might have without escaping from the block. Having a slowing down time larger, the K value is increased. The second reason is the fact that as we become more sensitive to thermal motion of atoms, the mean energy loss by elastic scattering is decreasing progressively. At last, the increase of K above 5 keV is coming from the parameter t_0 which value is set to minimize the variation of K around its mean value. We have set here t_0, the time necessary to go from 14 MeV to 800 keV by elastic scattering, equal to 0.45μs.

3.2 Flux measurements

The^3He energy spectrum gives a relative validation measurement of the neutron flux description in relation to the simulation. The energy spectrum deduced from the^{233}U fission rate gives the absolute neutron flux in the lead block where the (n,γ) measurement is made, using the neutron source calibration.

3.2.1 Measurements with^3He counter Figure ?? shows the^3He (n,p) reaction rate measured and simulated by using ENDF/B-VI and JENDL3.2 data bases for lead cross sections. It has first been checked that the^3He cross sections given by the three data bases (ENDF/B-VI, JEF2.2, JENDL3.2) are quite identical, the one finally used being ENDF/B-VI.

Above 100 keV the experimental spectrum shows a counting rate much higher than the simulated one: in this energy range, corresponding to the neutron pulse, the counter sees many events due to γ-rays and other processes, not directly due to neutrons,, which are not described by the simulation. This energy range will not be exploited here.

Below 50 keV the experimental reaction rate is particularly well described by the simulation using JENDL3.2 for lead. The use of ENDF/B-VI leads to an underestimation: this comes probably from the missing^{204}Pb isotope which contributes for 1.4% in natural lead, and from a different description in the unresolved resonance region. It must also be noticed than below 1 keV ENDF diffusion cross section for natural lead is 1.5% lower than the JENDL one. A weak discrepancy between simulations and measurement is observed around 0.5 eV, which can be due to a lack of knowledge of impurity proportions in the lead, as Cadmium for instance.

3.2.2 Absolute neutron flux Irradiations: 14 MeV neutron transport in the lead block and monitoring calibration

Irradiation of Nickel foils brings two types of results. The (n,2n) reactions^{58}Ni having a threshold around 13 MeV, Ni targets put at different places in the lead block are sensitive to neutrons coming almost directly from the TiT target of GENEPI. The dimming of the source neutron flux can be observed. This reduction follows a 1/x^{4.5} law, x being the distance to the neutron source. The simulation of the propagation shows a good agreement with the measurement. Thanks to the Nickel foils irradiation the number of neutrons emitted by the TiT target in 4π has been determined with an incertainty of 15% which comes mainly from (n,2n) cross section. The neutron number in this experiment is equal to 1.7×10^6 n/pulse and which permits to calibrate the neutron monitoring.

233U fission measurements

As explained above, below 50 keV the neutron flux is well simulated using JENDL3.2 data base for lead. We investigate now the most appropriate data base to describe^{233}U fission cross section and the subsequent flux. Figure ?? shows the experimental and simulated^{233}U fission rate using ENDF/B-VI and JENDL3.2 for^{233}U, that is to say N_{U3}ε_f σ_f (E)Φ(E)fN_{n/pulse}, where N_{U3} is the number of^{233}U atoms of the target, ε_f a factor including the detection efficiency and the solid angle, σ_f (E) the fission cross section, Φ(E) the neutron flux, f the GENEPI repetition rate and N_{n/pulse} the number of source neutron per pulse. The absolute fission rate per source neutron N_{U3}ε_f σ_f (E)Φ(E) can be determined by the knowledge of N_{U3}ε_f , experimentally obtained from the α activity A_α measurement of the target in the same geometrical conditions: we obtain then A_α = N_{U3}ε_αλ_{U3} with ε_f = ε_α as the set-up is exactly the same for fission as for α detection, and as the^{233}U target is very thin. The absolute fission rate per source neutron can then be written N_f (E) =^{Aα}_{λU 3} σ_f (E)Φ(E) and we can finally deduce

σ_f (E)Φ(E) =

N_f (E) ln 2 A_αT_{1/2U3}fN_{n/pulse} .

This leads to an absolute flux measurement between 1 eV and 40 keV per source neutron which can be compared to simulations. Despite the fact that the counting stastitics is a little bit too low, the reaction rate shape is well described from 0.03 eV up to 100 eV within 10%. A discrepancy can be seen between 100 and 500 eV for both data bases, whereas between 2 keV and 10 keV the agreement is better with JENDL3.2.

Figure ?? shows the neutron flux in the^{233}U target: experimental fission rate has been divided by the ENDF cross section widened by the lead block resolution, and is compared with simulated fission rates divided by both ENDF and JENDL widened cross sections. This procedure sets the flux free from the data base defects. The flux is found then well described from 0.03 eV to 100 keV. Around 2-3 eV a flux deficit is observed for the three plots which is due to an insufficient broadening of the 1.8 eV resonance of^{233}U fission cross section. The general isolethargic behaviour of neutron flux in the lead, i.e. Φ(E) ∝ 1/E, is also found. The slow variation of the flux above 1 eV is due to neutron captures in the lead whereas below 1 eV the slope is stronger because of neutron escape from the block.

3.2.3 Capture rate in Au As Gold capture cross section is well known and data bases are in good agreement, this element can be chosen as a reference. In figure ?? the measured and normalized capture rate of a 125 μm Au foil is compared to simulations made again with both ENDF/B-VI and JENDL3.2 data bases for lead. Below 2 keV, as seen for (n,p) reaction on^3He, the capture rate is described with ENDF/B-VI as well as with JENDL3.2. Above 2 keV the agreement is excellent with JENDL3.2 but the use of ENDF/B-VI brings a discrepancy of 20% on the Au capture rate. The weak discrepancy between experiment and the JENDL3.2 simulation in the 3-5 keV energy region will be discussed in § 4.2.

3.3 Conclusions about the flux

We have seen in this section the high sensibility of the simulation on the choice of the data base for a material as important as lead. A very good description of the neutron flux is obtained in the energy range 0.05 eV to 50 keV by using JENDL3.2 for Lead for which we recommend the use of this data base. This is based in two independent measurements^3He(n,p) and^{197}Au(n,γ). The results obtained by irradiation of Nickel foils and exploiting the 13 MeV-threshold reaction give the absolute number of neutrons emitted by the TiT source and the source neutron propagation in the lead spectrometer. GENEPI neutron production being necessary to know the absolute neutron flux in the lead block, we have shown the validity of this quantity by the comparison of the experimental^{233}U fission rate to the simulated one.

We can then conclude that between 14 MeV and 40 keV, despite the lack of measurement, the neutron transport is well reproduced by the simulation using the JENDL3.2 data base. The neutron flux for energies lower than 40 keV measured with 3 different experimental method is also very well described by simulation within 5%.

4 Capture results

4.1 Thin an thick Au targets for simulation validation

In section 3.2.3 we have presented results for a 125 μm thick Au foils as a mean of validation of the neutron flux simulaton with JENDL3.2 for lead. All the simulations that will be shown in this section will use this data base for neutron transportation in Lead.

As for Gold no dependance is seen on the data base, we can concentrate on the MCNP simulation ability to take into account the self-shielding effects in the target. Three capture rate measurements have been made with Au targets of different thicknesses : 125 μm, 500 μm and 1250 μm. Figure ?? shows measurements and simulations normalized in the resolved resonance region, i.e. between 1 eV and 100 eV. This region has been chosen as the cross section of the studied nuclide is well known. A very good agreement is found over a wide energy range (0.05 eV up to 30 keV) for three thicknesses. The two first resonances of Au at 4.9 eV and 60 eV are clearly seen. The reduction of the capture rate maximum and the broadening of the 4.9 eV resonance is well taken into account by simulations. Considering the energy resolution of the lead spectrometer, it is not possible to separate high energy resonances. But calculations reproduce rather well the variations of the cross section. The only discrepancy greater than 10% is found between 2 keV and 5 keV for all thicknesses. So, it is not due to a bad description of the self-shielding effects and cannot be attributed to a wrong neutron flux either (cf. section 3.2). This discrepancy has the same magnitude for the three thicknesses. This behaviour can be understood as follows. The total cross section σ_{tot} = σ_{el} + σ_{(n,γ)} is correct. But σ_{(n,γ)} has been underestimated while σel is overestimated by the same quantity. Since the self-shielding effect is mainly controled by σ_{tot} (which is supposed constant), although in σ_{(n,γ)} has resonances are present, the underestimation of (n,γ) reaction does not depend on target thickness.

Considering these results we propose a so called ”correction table” for the capture cross section in this energy range (i.e. when the discrepancy between simulation and measurement is more than 5%). These correction factors are resumed in table 2.

4.2 Experimental and simulation data on (n,γ) reaction rates on various samples 4.2.1 Tantalum Measurements have been made for three thicknesses (100 μm, 200 μm and 2000 μm). Data bases available for this element are ENDF/B-VI, JEF2.2 and JENDL3.2. All the results are presented in figure ??. First of all, the good agreement between experiment and simulation made with the different data bases can be noticed from 0.1 eV to 300 eV, whatever the thickness is. Self-shielding effects in Tantalum are well taken into account. Above 300 eV for the thinest targets the agreement is better with JENDL3.2. The maximum discrepancy with JEF2.2 and ENDF/B-VI is 15% at maximum.

In the case of the thickest (2000 μm) target, all data bases are in good agreement between 0.1 eV and 300 eV. In the 300 eV-3 keV energy range, a discrepancy of about 40% is found for ENDF/B- VI and JEF2.2 simulations in comparison with experiment while a good agreement is found for JENDL3.2. It must be noticed that JENDL3.2 gives resonances up to 2.2 keV whereas the other ones are smooth above 300 eV. Self-shielding effects are well taken into account if we use this data base because of the good resonance description of the cross section.

Above 3 keV the reaction rate is better described by ENDF. In this energy range self-shielding can be neglected. The discrepancy with JENDL here is not due to the cross section structure but to an absolute underestimation of it.

We can conclude that in general ENDF and JEF data bases give simulation results in worst agreement with measurements than JENDL and then advise users to take JENDL for Tantalum between 0.1 eV and 30 keV. However we can propose as for Gold a correction table for the JENDL3.2^{181}Ta capture cross section above 3 keV (see table 3).

4.2.2 Indium In figure ?? experimental and simulated reaction rates of Indium are presented, for the three data bases and for several thicknesses: 300 μm, 500 μm and 2000 μm. All data bases show an excellent agreement with experiment from 0.1 eV to 1 keV for the three thicknesses. Between 1 keV and 2 keV, simulations using ENDF/B-VI and JENDL3.2 underestimate the real capture rate. JEF2.2 shows an agreement within 10%. Above 2 keV, In capture cross section given by ENDF/B-VI or JENDL3.2 is 25% higher than the one given by JEF2.2, but the three cross sections do not present resonances in this energy range. The strongest discrepancy is obtained with JENDL3.2 which shows a 30% overestimation around 3 keV. ENDF/B-VI shows also varying discrepancies in this region with a maximum of 25% at 500 eV. JEF2.2 shows a mean underestimation of the capture rate in this energy range of about 20%. For this element we notice that no data base gives a satisfactory results above 2 keV. Then we propose a correction table to be applied to JEF2.2 in table 4.

4.2.3 Thorium Figure ?? presents calculated and measured capture rates for three Thorium samples. First of all we observe a good agreement within 5% between ENDF and JEF simulations and experiment for the three thicknesses (175 μm, 1000 μm, and 4000 μm) in the 12 eV-40 keV energy range. JENDL data base shows a discrepancy with experiment of about 15% between 600 eV and 5 keV. In this range, the capture cross sections of the three data bases are described by a resonance structure, but the mean level of the JENDL one is about 15% weaker than the ENDF and JEF ones. Below 10 eV, considering the weak value of the Th capture cross section (∼0.3 barn), the quick decrease of the neutron flux and the strong background observed due to Thorium radioactivity, the signal to background ratio in this energy range is weak. This explains the strong fluctuations in the experimental spectra. In this region it is impossible to say which data base is the most satisfactory despite the discrepancies observed between ENDF/B-VI and JENDL3.2 in the 1 eV to 10 eV region. Consequently for^{232}Th ENDF/B-VI and JEF2.2 can be chosen as they give the best agreement with experiment. In this case, because of relatively large errors we do not propose a correction table as for the previous nuclides.

4.2.4 Silver Results for simulated and measured reaction rates for three thicknesses are resumed in figure ??. We observe a very good agreement between experiment and simulation and also a good taking into account of self-shielding effects in the 0.1 eV-600 eV energy range.

ENDF data base shows an important discrepancy of about 35% between 600 eV and 3 keV. In our case, for ENDF, natural Silver is composed with two isotopes:^{107}Ag and^{109}Ag. The discrepancy is reduced to 10% above 3 keV where the capture cross section is described by a smoothed curve. JEF2.2 and JENDL3.2 data bases present an underestimation of the reaction rate of about 20% between 600 eV and 1 keV. JENDL3.2 is in agreement with experiment for the three thicknesses, from 1.2 keV to 4 keV. Reaction rates given by JEF2.2 show an overestimation in the 1 keV-4 keV range of about 20%. But capture rate is well described by this base above 4 keV. Consequently if we can dismiss ENDF/B-VI data base because of the too important discrepancy observed above 600 eV, our choice is settled on JEF2.2 or JENDL3.2. We propose a correction table (table 5) to be applied to JENDL3.2 because of its description with resonances up to 7 keV which seems to have more sensitivity on self-shielding effects as it was shown for the case of Tantalum.

4.2.5 Technetium We also did a measurement with Technetium with a sample of 344 mg of^{99}Tc diluted in 6.4 g of Aluminium. Simulations have been performed with the three data bases. Results are shown in figure ??.

A good agreement is obtained in the 0.1 eV-40 eV energy range between simulations and experiment. The position of the 20 eV resonance is better described by JENDL3.2 and JEF2.2 but with ENDF it is shifted to about 21 eV: despite the weak resolution of the lead block we are sensitive to small shifts.

Between 40 eV and 4 keV none of the three data bases give a better description of the capture rate than 10%. ENDF/B-VI is the worst one with a discrepancy of 35% from 80 eV to 500 eV. The rate simulated with JENDL3.2 shows also a 25% underestimation between 80 eV and 3 keV. The data base which fits the best the experiment is JEF2.2. We find a discrepancy of 20% between 150 eV and 700 eV which appears like an overestimation of the reaction rate in comparison with the experiment. But we can also observe that resonance positions given by experiment - 165 eV and 350 eV - are better described by JENDL3.2 than by JEF2.2, this last one giving respectively 180 eV and 365 eV. Above 1 keV, despite observed experimental errors, JEF2.2 describes more satisfactory the experimental reaction rate than ENDF and JENDL.

Therefore ENDF shows the worst agreement with our experiment. Even if the resonance structure is similar in JEF and JENDL, this last one gives a better general description of the reaction rate over all the energy range studied (0.1 eV-40 keV). We will thus apply the correction table 6 to JENDL cross section.

mentionner les resultats de Lepretre

4.2.6 Manganese Results of simulated and measured capture rate for^{55}Mn are shown in figure ??. The only energy range to be in agreement is the 0.1 eV to 40 eV region. Above 40 eV strong discrepancies appear between the different data bases and experiment. We can notice that resonance positions given by the different capture cross section are not satisfactory. The width of the 336 eV resonance is not well described by ENDF/B-VI and JENDL3.2. Experiment presents a maximum capture rate at 2.2 keV which is not reproduced by simulations.

In that case, considering the strong discrepancies observed between simulated capture rates and our measurement, we cannot propose a correction table, but we suggest that the capture cross section of this nuclide should be re-measured and re-evaluated.

4.2.7 Naturel Nickel A measurement with a 3 mm natural Nickel sample has been done. This element is of interest as it is present in steel composing structure materials of nuclear reactors. Experiment and simulations are shown in figure ??.

A good agreement is found from 0.1 eV to 50 eV. But strong discrepancies are observed on reaction rates given by ENDF/B-VI and JENDL3.2 in the 1 keV-10 keV range. JENDL3.2 gives a maximum reaction rate at 1350 eV which does not appear with ENDF/B-VI or JEF2.2. Cross section structures are very different above 1 keV. If we compare this simulation to experiment, we see that the simulation is in desagreement with experimental data over all this energy range. A capture rate maximum is observed at 16 keV in simulations, whereas it is at 12.5 keV for experiment. As in the case of Mn, we do not propose a correction table because of the too big discrepancies. A new measurement and evaluation of the Nickel capture cross section should be made.

Conclusion

Using precise measurements in a LSDS and their very detailed numerical simulation with MCNP code, it has been possible to check the validity of different data bases.

The first result was to show the sensitivity (1%) of slowing down time to the elastic scattering of the Lead medium. In Lead medium, precise energy dependence of the neutron flux allows us to strongly recommend the JENDL3.2 data base for Lead. This recommendation is also fully supported by (n,γ) reaction rate on Au targets.

The second result is that the presented methodology (measurement, data analysis, simulation) provides a check of the validity of the data base within a 5% precision. As foreseen it appears that for neutron energy below 200 eV the (n,γ) cross section are well determined. Usually the different data bases do not differ significantly.

At higher energy the (n,γ) cross sections from data bases are quite different. The experimental data provide either a recommendation for using a special data base and a correction factor table in order to reprodure experimental data with an error of less than 10%. In some cases (Ni and Mn) the recommendation is to re-measure the (n,γ) cross section.

The overall conclusion is that despite the poor energy resolution of the LSDS, precise indications on the validity or deviations of data bases cross section can be obtained either for elastic and capture cross section in Lead or small samples (n,γ) cross sections, and with rather short beam time (about a day). It must be pointed out that measurements with different thicknesses show the importance of resonance in the so-called unresolved resonance region. Finally the LSDS appears a very efficient tool to test different elements cross sections and recommend a particular data base and in some case the use of correction factors.

Acknowledgement

The authors would like to thank the neutron generator builders and operator teams, the electronic development group for developping an efficient data acquisition system. This work has been partly supported by GEDEON, concerted research organisations, and PACE CNRS program.

References

[1] D.Karamanis, M.Petit, S.Andriamonje, G.Barreau, M.Bercion, A.Billebaud, B.Blanck, S.Czajkowski, R.Del Moral, J.Giovinazzo, V.Lacoste, C.Marchand, L.Perrot, M.Pravikoff, J.C.Thomas.

Nucl. Sci. and Engin., (2001), to be published.

[2] A.A. Bergman et al., International Conference on the Peaceful Uses of Atomic Energy, Vol. 1, Geneva, 1955, p.642.

[3] A.A. Bergman, et al., Sov. Phys. JETP 6 (1958) 6. [4] M. Sawan, R.W. Conn, Nucl. Sci. Eng. 54 (1974) 127.

[5] C. Rubbia, Relation between time and kinetic energy in a constant lethargy medium, CERN/AT/ET Internal Note 95-010, May 1995.

[6] A. Abnades et al., Nucl. Instr. and Meth. in Physics Research A 0 (2001) 1 [7] H.Nifenecker et al.

Revue, (?).

[8] J.F.Briefmeister.

Los Alamos Laboratory Report LA-12625-M (1997).

[9] Nuclear Data Tables,11 (1973) 601.

[10] Auteurs.

Revue,no (annee) pages.

Time (μs) Energy (eV) Element 178 5.3 Ag 50 67 Ce 34.5 140 Ce+Co 26 244 Ce 16.3 612 Cu 9.3 1.82 Pb+Ce 6.6 3.5 Pb

Table 1: Main identified resonances of the background with their associated element.

Energy Range ⟨σ_{(n,γ)}(E)⟩^{Δσϕ(C−E)}_{σϕE} Correction (eV) (barns) e=125μm e=500μm e=1250μm factor 725.70<E<916.27 10.36 -1.11e-02 -1.32e-02 -1.68e-02 1.00 916.27<E<1156.89 7.35 -4.37e-02 -3.99e-02 -8.74e-02 1.06 1156.89<E<1460.68 5.55 -4.81e-02 -5.69e-02 -5.22e-02 1.05 1460.68<E<1844.26 4.10 -3.89e-02 -8.57e-02 -7.42e-02 1.07 1844.26<E<2328.56 2.64 -1.12e-01 -1.28e-01 -1.25e-01 1.12 2328.56<E<2940.04 2.39 -1.43e-01 -1.61e-01 -1.76e-01 1.16 2940.04<E<3712.10 1.97 -1.47e-01 -1.25e-01 -1.35e-01 1.14 3712.10<E<4686.89 1.99 -1.27e-01 -1.00e-01 -8.68e-02 1.11 4686.89<E<5917.67 1.89 -3.67e-03 -1.38e-02 2.88e-02 1.00 5917.67<E<7471.65 1.57 8.52e-03 3.39e-02 5.62e-02 1.00 7471.65<E<9433.71 1.33 1.93e-02 2.33e-02 4.59e-02 1.00

Table 2: Proposition of correction factors for ENDF/B-VI capture cross section of^{197}Au in the 1 keV- 5 keV energy range. The data base mean cross section, the relative difference between calculated (C) and experimental (E) σΦ for different thicknesses, and the final correction factor are given.

Energy Range ⟨σ_{(n,γ)}(E)⟩^{Δσϕ(C−E)}_{σϕE} Correction (eV) (barns) e=100μm e=200μm e=2000μm factor 725.70<E<916.27 9.30 -1.94e-02 -3.53e-02 -7.36e-02 1.00 916.27<E<1156.89 9.68 -3.61e-02 -1.15e-01 -9.60e-02 1.10 1156.89<E<1460.68 6.86 -7.64e-02 -1.31e-01 -1.31e-01 1.13 1460.68<E<1844.26 5.57 -5.13e-02 -1.31e-01 -1.70e-01 1.17 1844.26<E<2328.56 3.71 -9.37e-02 -1.47e-01 -1.46e-01 1.15 2328.56<E<2940.04 3.89 -7.56e-02 -8.38e-02 -1.21e-01 1.12 2940.04<E<3712.10 3.32 -3.54e-02 -7.72e-02 -1.01e-01 1.10 3712.10<E<4686.89 2.86 -4.87e-02 -1.13e-01 -1.03e-01 1.10 4686.89<E<5917.67 2.43 -2.62e-02 -8.86e-02 -1.18e-01 1.12 5917.67<E<7471.65 2.04 -5.72e-02 -1.17e-01 -1.51e-01 1.15 7471.65<E<9433.71 1.71 -2.33e-02 -1.40e-01 -1.67e-01 1.17 9433.71<E<11911.00 1.36 -5.24e-02 -1.33e-01 -1.84e-01 1.18 11911.00<E<15038.84 1.15 -6.62e-02 -1.48e-01 -2.03e-01 1.20 15038.84<E<18988.04 0.98 -8.65e-02 -1.90e-01 -2.14e-01 1.21

Table 3: Proposition of correction factors for JENDL3.2 capture cross section of^{181}Ta in the 800 eV- 20 keV energy range. The data base mean cross section, the relative difference between calculated (C) and experimental (E) σΦ for different thicknesses, and the final correction factor are given.

Energy Range ⟨σ_{(n,γ)}(E)⟩^{Δσϕ(C−E)}_{σϕE} Correction (eV) (barns) e=300μm e=500μm e=2000μm factor 1156.89<E<1460.68 1.92 1.69e-01 -5.33e-02 -6.70e-02 1.00 1460.68<E<1844.26 1.74 -8.78e-02 -1.28e-01 -1.51e-01 1.14 1844.26<E<2328.56 1.58 -1.29e-01 -1.65e-01 -1.60e-01 1.16 2328.56<E<2940.04 1.44 8.41e-02 -1.45e-01 -1.52e-01 1.15 2940.04<E<3712.10 1.33 -9.02e-02 -1.31e-01 -1.36e-01 1.13 3712.10<E<4686.89 1.24 -1.86e-01 -1.69e-01 -1.27e-01 1.15 4686.89<E<5917.67 1.15 -2.01e-01 -1.77e-01 -1.16e-01 1.15 5917.67<E<7471.65 1.07 -1.95e-01 -1.91e-01 -1.31e-01 1.16 7471.65<E<9433.71 1.00 -2.28e-01 -1.85e-01 -1.49e-01 1.17 9433.71<E<11911.00 0.91 -2.00e-01 -1.68e-01 -1.45e-01 1.16 11911.00<E<15038.84 0.84 -1.95e-01 -2.07e-01 -1.62e-01 1.18 15038.84<E<18988.04 0.77 -2.12e-01 -1.86e-01 -1.76e-01 1.18 18988.04<E<23974.29 0.70 -1.90e-01 -1.94e-01 -1.87e-01 1.19 23974.29<E<30269.95 0.62 -2.10e-01 -2.24e-01 -1.94e-01 1.21

Table 4: Proposition of correction factors for JEF2.2 capture cross section of natural Indium in the 1.5 keV-40 keV energy range. The data base mean cross section, the relative difference between calculated (C) and experimental (E) σΦ for different thicknesses, and the final correction factor are given.

Energy Range ⟨σ_{(n,γ)}(E)⟩^{Δσϕ(C−E)}_{σϕE} Correction (eV) (barns) e=100μm e=300μm e=1200μm factor 600.00<E<725.70 3.57 -2.55e-01 -2.82e-01 -2.83e-01 1.27 725.70<E<916.27 2.50 -1.91e-01 -2.68e-01 -2.27e-01 1.23 916.27<E<1156.89 3.01 3.53e-02 -8.61e-02 2.05e-02 1.00 1156.89<E<1460.68 3.54 1.96e-01 -1.09e-02 9.71e-02 0.91 1460.68<E<1844.26 3.04 4.56e-02 -4.74e-02 1.46e-02 1.00 1844.26<E<2328.56 2.57 9.66e-03 -1.32e-01 -3.70e-02 1.05 2328.56<E<2940.04 2.05 1.40e-03 -9.08e-02 -6.95e-02 1.05 2940.04<E<3712.10 1.99 -6.10e-02 -1.19e-01 -8.17e-02 1.09 3712.10<E<4686.89 1.76 -1.04e-01 -1.38e-01 -9.06e-02 1.11 4686.89<E<5917.67 1.66 -8.09e-02 -1.56e-01 -8.05e-02 1.11 5917.67<E<7471.65 1.48 -6.96e-02 -1.03e-01 -7.16e-02 1.08 7471.65<E<9433.71 1.52 -8.51e-02 -9.15e-02 -6.76e-02 1.08 9433.71<E<11911.00 1.33 -7.08e-02 -9.93e-02 -7.65e-02 1.08 11911.00<E<15038.84 1.23 -5.14e-02 -1.12e-01 -8.46e-02 1.08 15038.84<E<18988.04 1.13 -9.65e-02 -1.40e-01 -9.62e-02 1.11 18988.04<E<23974.29 1.03 -2.64e-02 -1.42e-01 -9.39e-02 1.09 23974.29<E<30269.95 0.92 -6.29e-02 -1.51e-01 -9.85e-02 1.10

Table 5: Proposition of correction factors for JENDL3.2 capture cross section of natural Silver in the 600 eV-40 keV energy range. The data base mean cross section, the relative difference between calculated (C) and experimental (E) σΦ for different thicknesses, and the final correction factor are given.

Energy Range ⟨σ_{(n,γ)}(E)⟩^{Δσϕ(C−E)}_{σϕE} Correction (eV) (barns) m=344mg factor 70.49<E< 89.00 1.16 -3.11e-01 1.31 89.00<E<112.37 3.99 -2.54e-01 1.25 112.37<E<141.87 5.04 -2.85e-01 1.28 141.87<E<179.13 12.35 -2.84e-01 1.28 179.13<E<226.17 7.21 -2.69e-01 1.27 226.17<E<285.56 4.88 -3.27e-01 1.33 285.56<E<360.55 6.09 -2.52e-01 1.25 360.55<E<455.23 4.83 -1.33e-01 1.13 455.23<E<574.77 3.62 -1.62e-01 1.16 574.77<E<725.70 3.36 -1.69e-01 1.17 725.70<E<916.27 3.22 -2.24e-01 1.22 916.27<E<1156.89 2.73 -2.16e-01 1.22 1156.89<E<1460.68 2.81 -2.88e-01 1.29 1460.68<E<1844.26 1.78 -2.53e-01 1.25 1844.26<E<2328.56 1.81 -2.49e-01 1.25 2328.56<E<2940.04 1.87 -1.07e-01 1.11 2940.04<E<3712.10 2.33 -4.59e-02 1.00

Table 6: Proposition of correction factors for JENDL3.2 capture cross section of^{99}Tc in the 80 eV- 4 keV energy range. The data base mean cross section, the relative difference between calculated (C) and experimental (E) σΦ for a 344 mg target, and the final correction factor are given.