arXiv:nucl-ex/0509014v1 9 Sep 2005

The reaction^{13}C(α,n)^{16}O: a background for the observation of geo-neutrinos

S. Harissopulos^1, H. W. Becker^2, J. W. Hammer^3, A. Lagoyannis^1, C. Rolfs^4, F. Strieder^4 1Institute of Nuclear Physics, NCSR“Demokritos”, 153.10 Aghia Paraskevi, Athens, Greece 2Dynamitron-Tandem-Laboratorium, Ruhr-Universität Bochum, 44801 Bochum, Germany 3Institut für Strahlenphysik, Universität Stuttgart, 70569 Stuttgart, Germany and 4Institut für Physik mit Ionenstrahlen, Ruhr-Universität Bochum, 44801 Bochum, Germany (Dated: July 15, 2018)

Abstract

The absolute cross section of the^{13}C(α,n)^{16}O reaction has been measured at E_α = 0.8 to 8.0 MeV with an overall accuracy of 4%. The precision is needed to subtract reliably a background in the observation of geo-neutrinos, e.g. in the KamLAND detector.

PACS numbers: 25.40.Ny, 26., 27.20.+n

I. INTRODUCTION

In order to understand better the energy source of the earth, e.g. the radioactive decay of U, Th and others, the KamLAND neutrino detector is planning to observe the geo-neutrinos from these decays. The antineutrinos ν_a from the decays in the earth interact with the protons in the liquid scintillator of KamLAND via the inverse β decay ν_a+p→n+e^+ and are detected with phototubes via the combination of (i) a prompt signal from the slowing down and annihilation of the e^+ and (ii) a delayed signal provided by the 2 MeV γ-ray from the p(n,γ)d reaction, which occurs after the neutron has been thermalized.

The KamLAND detector consists of 1 kilotons of organic scintillator and contains thus about 10 tons of^{13}C. The detector contains also 10^{−20} g/g of^{210}Pb nuclides (halflife = 22.3 y), which decay via^{210}Bi and^{210}Po into^{206}Pb emitting in the process a 5.3 MeV α-particle. When these α-particles slow down in the scintillator, they can initiate the^{13}C(α,n)^{16}O reaction (Q = 2.215 MeV), whereby the fast neutrons perfectly mimic the antineutrino signal. Firstly, the few MeV neutron transfers its kinetic energy to the protons in the medium, such that a few MeV proton emerges from this first collision. The proton in turn produces ionisation, which results in a prompt signal simulating (i). A prompt signal (i) can also be created in the slowing down (ionization) of the 5.3 MeV alpha-particle. Secondly, as the neutron is slowed down it will create a signal like (ii). In this way a fake antineutrino signal is built.

The^{13}C(α,n)^{16}O reaction creates an important background and gives a number of fake events which are comparable to those expected from geo-neutrinos [? ]. For detecting geoneutrinos one needs to subtract the fake events in a reliable way. With the present 30% uncertainty in the absolute cross section σ of^{13}C(α,n)^{16}O over the relevant energy range (measured in [? ] at E_α = 1.0 to 5.4 MeV), it appears impossible [? ] to extract a geoneutrino signal from any detector at any place in the world. Calculations indicate [? ] that for a 10% uncertainty in σ the discovery of geo-neutrinos will be achievable. In recent years new precise σ measurements have been carried out at low energies [? ? ], i.e. below E_α = 1.1 MeV. We report on new precise σ measurements in the energy range E_α = 0.8 to 8.0 MeV.

II. EQUIPMENT AND PROCEDURES

The tandem accelerator of the Dynamitron - Tandem - Laboratorium (DTL) at the Ruhr- Universität Bochum provided the^4He beam, with a current on target of less than 100 nA. The absolute energy of the beam was checked to a precision of ±3 keV; the energy spread was 0.8 keV at E_α = 1.0 MeV. The beam passed through collimators of Ø = 15, 3, and 5 mm diameter at a distance from the target of 3.06, 1.43, and 0.80 m, respectively, and was stopped at the target. The air-cooled target (Ø = 40 mm) was installed in an electrically insulated pipe of 0.80 m length (Ø = 40 mm), which served as a long Faraday cup. A suppression voltage of 300 V was applied to the last aperture in front of the target pipe and this led to a precision of 2% in the charge measurement at the target. The vacuum was better than 3×10^{−7} mbar.

The 22 μg/cm^2 thick C target (on a 0.2 mm thick Ta backing) was enriched to 99% in 13C. The enrichment was confirmed within ±2% using the narrow resonance at E_{pr} = 1.748 MeV in^{13}C(p,γ)^{14}N (γ-ray detection with a 12×12 inch NaI crystal in close geometry, placed at another beam line) and comparing the thick-target γ-ray yields obtained for the above enriched target as well as for a C target of natural isotopic composition (^{13}C = 1.1%). The results are shown in Fig. 1, where the enriched target was analysed at the completion of the^{13}C(α,n)^{16}O experiment: the 50% yield-point is identical for both targets indicating no detectable deposition of natural carbon on the enriched target. The deduced target thickness for the enriched target (Fig. 1) was Δ_p = 3.25±0.10 keV, consistent with the value Δ_p = 3.14±0.10 keV obtained initially. The results for the E_{αr} = 1.054 and 1.336 MeV narrow resonances in^{13}C(α,n)^{16}O are shown in Fig. 2 leading to Δ_α = 37.0±1.0 and 33.2±1.0 keV, respectively. Using stopping power tables [? ] (with a 3% uncertainty [? ]) one arrives at an average value for the^{13}C areal target density of N_t = (10.21±0.31)×10^{17} atoms/cm^2, where the quoted error arrives from the uncertainty in the stopping power.

The neutron yields were measured using a 4π detector consisting of thermal-neutron detectors, i.e. 16^3He-filled proportional counters (sensitive length = 45.7 cm, Ø = 2.54 cm, pressure = 4 bar), embedded in a polyethylene-cylinder moderator (length = 1.00 m, Ø = 35.0 cm) with a central bore hole (Ø = 7.0 cm) to install the target. At an inner circle of Ø = 16.0 cm there were 8^3He counters and at Ø = 24.0 cm there were another 8^3He counters, all embedded in holes of Ø = 3.0 cm in the moderator. The inner and outer counters are positioned with a relative angle difference of 22.5^∘. To reduce the neutron background arising from cosmic showers, several components for passive shielding (Cd, polyethylene, bor-polyethylene, bor-paraffin) are placed around the moderator leading to a background rate of 0.22 counts/s. In the present experiment the spectra of the 16 counters were summed and stored in an ADC. To monitor dead time effects (kept below 4%), a pulser was used.

The neutron efficiency η_n(E_n) as a function of neutron energy E_n (in MeV) was calculated with the Monte Carlo program MCNP leading to the expression [? ]

η_n(E_n) = 0.7904 + 0.1607(E_n + 247.07)exp(−0.114E_n)[%] (1)

at E_n = 2.0 to 9.0 MeV. With a calibrated (±1.1%)^{252}Cf source, the neutron detection efficiency at the mean energy E_n = 2.3 MeV was found [? ] to be 32.1±0.5% in good agreement with the calculated value 31.6%. We used the calculated curve to correct the observed neutron yields for efficiency: over the energy range of the present experiment, E_α = 0.8 to 8.0 MeV, η_n(E_n) varies from 31% to 16% for a mean neutron emission angle of 90^∘.

III. RESULTS

An excitation function was obtained with the^{13}C target at energies between E_α = 0.8 and 8.0 MeV in steps of δ = 10 keV, where the target thickness Δ(E_α) varied between 39 and 13 keV, respectively. The exceptions in steps are for E_α >7.2 MeV (δ = 20 keV) and near narrow resonances (δ = 0.2 keV). The statistical error of each data point was better than 0.2%. After completion of the excitation function, yield tests were performed at selected energies over the total energy range leading to a reproducibility of better than 2% (=relative error).

For non-resonant energies, where the yields change slowly with energy, the observed yields (and thus the cross sections) are associated with an effective energy E_{eff} over the target thickness Δ(E_α) [? ]. For energies with resonance structures, where the resonance width is comparable to the target thickness, the deduced value E_{eff} and associated yield represents a mean cross section over Δ(E_α).

The observed neutron yield N_n at a given E_{eff} is related to the cross section σ(E_{eff} ) via the relation [? ] N_n = N_αN_tη_nσ(E_{eff} ) (2) where N_α is the number of incident α projectiles. At E_{eff} = 1.00 MeV we found σ(E_{eff} ) = 157±7 μb, where the error corresponds to the quadratic sum of the uncertainties in N_n (1.6%), N_α (2.0%), N_t (3.0%) and η_n (1.7%). Our value is in good agreement with the previous value of 146±7 μb [? ] leading to a weighted average of 152±5 μb, which we adopted as reference value.With the relative error of 2% and this absolute error of 3% one arrives at an overall accuracy of 4% for the data of the present work.

For the case of the narrow resonances at E_{αr} = 1.054 and 1.336 MeV (Fig. 2) and 1.590 MeV (not shown), the observed neutron yields lead to resonance strengths ωγ, which represent the integral over the resonance width Γ: the respective widths are Γ = 1.5, 0.6, and 1.0 keV [? ] and the respective strengths are ωγ = 12.1±0.6, 33.3±1.8, and 11.5±1.2 eV from the present work and ωγ = 11.9±0.6, not given, and 10.8±0.5 eV from [? ] leading to the accepted values of ωγ = 12.0±0.4, 33.3±1.8, and 10.9±0.5 eV. With these quantities we calculated the cross section σ(E_{αr}) at the energy region of these resonances.

Our cross-section results plotted in Fig. 3 are also given in Table I. The present absolute cross sections for the non-resonant data are lower by about 30% compared to the values reported in previous work [? ]: from the data shown in Fig. 3 of [? ] we find σ_{present}/σ_{[2]} ∼= 0.63, 0.68, 0.64, and 0.72 at the broader resonances E_α=2.3, 3.3, 4.4, and 5.0 MeV, respectively.

IV. CONCLUSIONS

With an overall accuracy of 4% for the absolute cross section of^{13}C(α,n)^{16}O one can subtract reliably this background in the KamLAND detector and thus the discovery of geo-neutrinos appears achievable.

Acknowledgments

This work supported in part by the German Academic Exchange Service (DAAD), the Hellenic State Scholarships Foundation (IKY), and the Dynamitron-Tandem-Laboratorium (DTL). The authors would like to thank G. Fiorentini for suggesting the experiment and J.

Wrachtrup for the loan of the neutron detector.

[] G. Fiorentini, private communication (2004); T. Araki et al., Nature 436, 499 (2005). [] J. K. Bair, F. X. Haas, Phys. Rev. C 7, 1356 (1973).

[] H. W. Drotleff, A. Denker, H. Knee, M. Soine, G. Wolf, J. W. Hammer, U. Greife, C. Rolfs, H. P. Trautvetter, Ap. J. 414, 735 (1993).

[] C. R. Brune, I. Licot, R. W. Kavanagh, Phys. Rev. C 48, 3119 (1993). [] J. P. Biersack, J. F. Ziegler, Transport of Ions in Matter, TRIM program version 2003 (IBM Research, New York, 1995) [] A. Denker, Ph.D thesis, Universität Stuttgart, (1994) unpublished.

[] C. E. Rolfs, W. Rodney, Cauldrons in the Cosmos (The University of Chicago Press, Chicago 1986)

FIG. 1: Thick target γ-ray yield for the narrow E_{pr} = 1.747 MeV resonance in^{13}C(p,γ)^{14}N obtained with a C target enriched in^{13}C and with a C target of natural isotopic composition.

FIG. 2: Thick target neutron yield for the narrow E_α = 1.054 and 1.336 MeV resonances in 13C(α,n)^{16}O obtained with a C target 99% enriched in^{13}C; and non-resonant yield has been subtracted from the data.

FIG. 3: Absolute cross section of^{13}C(α,n)^{16}O between E_{eff} = 0.77 and 7.96 MeV. The solid curve is to guide the eye only. For the narrow resonances at E_{αr} = 1.054, 1.336, and 1.590 MeV the corresponding resonant cross section was deduced from the measured strength and total width.

TABLE I: Absolute cross section of^{13}C(α,n)^{16}O

E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) 0.767 0.0026 1.588 4.30 2.385 67.5 3.220 67.0 4.065 20.2 4.878 32.9 5.721 227 6.553 244 0.786 0.0033 1.589 6.25 2.395 66.1 3.230 72.1 4.074 20.7 4.888 37.8 5.731 247 6.563 250 0.807 0.0051 1.590 10.5 2.405 65.3 3.239 78.2 4.083 14.8 4.897 44.2 5.740 254 6.573 241 0.826 0.0072 1.591 6.26 2.414 59.8 3.249 85.8 4.092 10.9 4.907 53.0 5.750 256 6.583 243 0.846 0.0108 1.592 4.33 2.424 53.3 3.259 91.9 4.102 8.85 4.917 64.0 5.760 252 6.593 245 0.866 0.0143 1.593 3.32 2.434 45.6 3.269 99.0 4.113 7.96 4.927 80.7 5.770 245 6.603 246 0.886 0.0202 1.595 3.02 2.444 38.6 3.279 104 4.122 7.28 4.937 98.7 5.779 235 6.613 245 0.906 0.0287 1.609 2.12 2.454 34.5 3.289 110 4.132 6.81 4.947 121 5.789 228 6.623 243 0.925 0.0384 1.619 2.17 2.464 32.3 3.299 116 4.142 6.61 4.957 129 5.799 223 6.633 246 0.945 0.0532 1.629 2.23 2.473 28.6 3.309 107 4.152 6.37 4.967 124 5.809 219 6.643 250 0.965 0.0801 1.639 2.29 2.483 26.2 3.319 103 4.162 6.20 4.976 110 5.819 218 6.653 252 0.975 0.0893 1.649 2.38 2.493 24.7 3.329 93.4 4.172 6.19 4.986 95.8 5.829 219 6.662 254 0.985 0.101 1.660 2.45 2.503 23.1 3.338 84.1 4.183 6.10 4.996 90.2 5.839 220 6.672 259 0.994 0.116 1.670 2.75 2.513 21.7 3.348 79.7 4.193 6.03 5.006 92.4 5.850 224 6.682 258 1.005 0.152 1.680 2.85 2.524 21.0 3.358 69.9 4.203 6.07 5.016 93.1 5.860 230 6.692 264 1.016 0.164 1.690 2.95 2.534 20.5 3.368 68.9 4.213 6.17 5.026 95.6 5.870 236 6.702 268 1.025 0.189 1.699 3.24 2.544 20.7 3.378 68.8 4.223 6.23 5.036 99.0 5.880 244 6.712 273 1.030 0.209 1.709 3.34 2.554 21.1 3.388 76.4 4.232 6.43 5.046 103 5.889 265 6.722 279 1.046 0.461 1.719 3.73 2.565 24.7 3.399 88.6 4.242 6.59 5.056 109 5.899 291 6.732 287 1.050 0.850 1.730 4.11 2.576 38.3 3.409 85.6 4.252 6.86 5.066 114 5.909 346 6.752 307 1.052 2.03 1.740 4.30 2.586 51.1 3.418 68.8 4.262 7.15 5.076 119 5.919 389 6.771 329 1.053 4.53 1.749 4.37 2.595 46.2 3.427 48.0 4.272 7.70 5.086 124 5.929 389 6.791 353 1.054 8.77 1.759 4.42 2.602 32.1 3.436 34.7 4.282 8.55 5.096 131 5.939 366 6.811 392 1.055 4.54 1.769 4.81 2.611 24.9 3.446 25.7 4.292 9.70 5.106 137 5.939 401 6.831 438 1.056 2.04 1.779 4.98 2.621 21.5 3.457 20.7 4.302 11.0 5.115 144 5.948 363 6.851 469 Continued on next page

TABLE I: – continued from previous page E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) 1.058 0.880 1.789 5.26 2.632 20.4 3.466 17.1 4.313 13.7 5.125 150 5.958 326 6.871 468 1.062 0.556 1.799 5.48 2.643 22.7 3.476 14.2 4.323 18.1 5.135 165 5.968 272 6.890 430 1.078 0.495 1.808 5.66 2.657 51.8 3.486 12.2 4.333 26.7 5.145 169 5.978 254 6.910 416 1.080 0.481 1.818 5.98 2.666 52.6 3.497 10.6 4.343 43.3 5.155 168 5.988 228 6.930 409 1.087 0.466 1.828 6.42 2.673 39.6 3.507 9.18 4.353 71.7 5.165 167 5.997 209 6.950 437 1.098 0.483 1.839 7.33 2.681 24.1 3.517 7.98 4.362 89.8 5.175 164 6.007 196 6.970 427 1.112 0.485 1.849 7.87 2.690 21.1 3.527 7.09 4.371 76.0 5.185 161 6.018 196 6.989 437 1.122 0.500 1.859 8.33 2.701 19.7 3.537 6.36 4.380 49.6 5.195 157 6.028 208 7.009 439 1.132 0.561 1.869 8.77 2.712 19.6 3.547 5.80 4.389 31.7 5.205 154 6.038 214 7.029 447 1.142 0.598 1.879 9.50 2.723 21.5 3.557 5.21 4.399 22.3 5.215 150 6.048 235 7.049 421 1.152 0.614 1.889 10.1 2.735 35.5 3.567 4.71 4.410 16.9 5.224 146 6.058 296 7.069 398 1.162 0.640 1.899 10.7 2.745 47.5 3.576 4.10 4.420 13.7 5.234 144 6.068 411 7.089 418 1.172 0.664 1.909 11.4 2.754 41.9 3.586 3.60 4.430 12.1 5.244 142 6.079 564 7.098 457 1.182 0.681 1.918 12.3 2.762 31.2 3.596 3.19 4.441 11.4 5.254 141 6.088 628 7.109 531 1.192 0.740 1.928 13.7 2.772 45.9 3.606 2.89 4.451 10.1 5.264 150 6.098 565 7.109 507 1.202 0.749 1.938 14.8 2.787 108 3.618 4.55 4.459 7.70 5.275 201 6.106 466 7.118 455 1.212 0.784 1.948 15.8 2.792 115 3.630 10.2 4.469 6.59 5.284 228 6.116 399 7.128 410 1.222 0.795 1.958 17.3 2.796 108 3.638 9.34 4.480 6.74 5.294 183 6.126 357 7.148 396 1.232 0.796 1.968 18.8 2.801 60.1 3.645 5.85 4.490 7.05 5.303 156 6.136 312 7.168 382 1.242 0.834 1.978 20.5 2.808 30.0 3.655 4.63 4.500 7.51 5.314 151 6.146 280 7.188 385 1.251 0.868 1.988 22.6 2.818 22.6 3.666 4.31 4.510 7.99 5.324 152 6.157 268 7.207 373 1.261 0.869 1.998 24.6 2.830 19.7 3.677 4.97 4.521 10.1 5.333 158 6.167 259 7.227 369 1.271 0.866 2.009 28.0 2.841 18.0 3.691 19.1 4.531 10.9 5.343 168 6.177 263 7.247 374 1.281 0.931 2.019 30.6 2.851 17.1 3.699 33.3 4.541 17.1 5.353 178 6.187 258 7.267 376 1.291 0.887 2.028 33.6 2.862 16.7 3.706 19.4 4.549 55.1 5.363 193 6.197 266 7.287 381 1.301 0.941 2.038 37.0 2.872 16.5 3.713 7.44 4.554 80.7 5.373 211 6.207 267 7.307 411 Continued on next page

TABLE I: – continued from previous page E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) 1.303 0.918 2.048 40.3 2.882 16.5 3.722 4.16 4.558 89.6 5.383 225 6.216 271 7.326 438 1.305 0.930 2.057 43.1 2.892 17.0 3.733 2.75 4.561 76.2 5.393 238 6.226 266 7.346 441 1.307 0.950 2.067 44.2 2.902 17.0 3.744 2.31 4.564 57.7 5.403 243 6.236 265 7.366 454 1.309 0.958 2.077 44.5 2.911 17.3 3.755 2.03 4.568 45.0 5.413 240 6.246 260 7.386 445 1.311 0.990 2.087 48.5 2.921 17.6 3.765 1.72 4.578 37.1 5.423 237 6.256 267 7.406 456 1.333 2.21 2.097 45.2 2.931 18.1 3.775 1.60 4.588 27.4 5.433 235 6.266 274 7.427 484 1.334 4.26 2.106 41.2 2.941 18.7 3.786 1.53 4.598 21.6 5.443 240 6.276 284 7.445 502 1.335 10.8 2.116 39.5 2.951 19.8 3.795 1.50 4.609 20.1 5.452 251 6.286 301 7.465 500 1.336 48.2 2.126 38.2 2.962 21.1 3.805 1.47 4.619 20.2 5.462 254 6.296 314 7.485 509 1.337 10.9 2.136 37.4 2.972 22.1 3.815 1.42 4.629 21.0 5.472 240 6.306 326 7.505 498 1.338 4.27 2.146 37.5 2.982 24.4 3.825 1.39 4.639 22.5 5.482 202 6.316 349 7.525 498 1.339 2.22 2.156 39.8 2.992 27.6 3.835 1.36 4.649 24.2 5.492 173 6.325 356 7.544 491 1.365 1.14 2.167 42.8 3.002 31.9 3.845 1.39 4.659 25.9 5.502 151 6.335 362 7.564 450 1.377 1.13 2.177 47.0 3.012 37.3 3.855 1.37 4.670 28.1 5.512 135 6.345 358 7.584 431 1.389 1.12 2.187 53.0 3.021 41.6 3.865 1.43 4.679 29.3 5.522 123 6.355 344 7.605 430 1.400 1.09 2.197 59.9 3.031 45.8 3.875 1.47 4.688 29.9 5.532 114 6.365 337 7.625 452 1.410 1.11 2.207 66.4 3.041 47.6 3.885 1.57 4.698 30.3 5.542 107 6.375 322 7.645 499 1.420 1.16 2.217 75.2 3.051 46.1 3.895 1.71 4.708 29.8 5.552 101 6.385 308 7.664 555 1.431 1.21 2.227 75.3 3.060 43.8 3.905 1.84 4.718 30.0 5.561 96.6 6.395 296 7.684 613 1.441 1.19 2.236 74.1 3.070 41.2 3.915 2.01 4.728 29.8 5.571 94.1 6.405 273 7.704 680 1.450 1.22 2.245 73.3 3.080 38.8 3.925 2.28 4.738 29.6 5.581 92.0 6.415 261 7.724 691 1.461 1.29 2.255 67.7 3.090 37.4 3.935 2.61 4.748 30.1 5.591 91.1 6.425 255 7.744 664 1.471 1.29 2.265 66.2 3.100 37.3 3.945 2.95 4.758 30.6 5.601 91.3 6.435 246 7.763 638 1.480 1.31 2.275 59.1 3.111 36.9 3.955 3.43 4.768 31.0 5.611 91.8 6.444 243 7.783 614 1.490 1.31 2.285 56.0 3.121 37.0 3.965 4.07 4.778 31.3 5.621 94.0 6.454 244 7.803 592 1.500 1.37 2.295 55.1 3.130 37.9 3.975 4.62 4.787 29.8 5.631 97.3 6.464 246 7.823 596 Continued on next page

TABLE I: – continued from previous page E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ E_{eff} σ (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) (MeV) (mb) 1.510 1.42 2.305 53.8 3.140 39.2 3.985 5.14 4.797 29.0 5.641 100 6.474 245 7.843 595 1.520 1.44 2.315 53.7 3.150 40.4 3.995 5.62 4.807 27.0 5.651 107 6.484 240 7.863 599 1.530 1.57 2.325 52.9 3.160 42.3 4.005 6.20 4.817 25.5 5.662 115 6.494 241 7.882 622 1.541 1.67 2.335 54.3 3.170 44.4 4.014 6.55 4.827 24.9 5.671 127 6.504 243 7.902 640 1.550 1.62 2.346 56.5 3.180 47.2 4.024 7.05 4.837 24.8 5.681 142 6.514 244 7.922 583 1.560 1.75 2.355 59.0 3.190 52.4 4.034 7.59 4.848 25.8 5.691 163 6.524 245 7.941 501 1.585 2.90 2.365 63.3 3.200 56.9 4.044 8.83 4.858 27.2 5.701 182 6.534 244 7.962 458 1.587 3.20 2.375 66.4 3.210 61.2 4.055 12.5 4.868 29.6 5.711 204 6.544 240