arXiv:physics/0701263v3 [physics.atom-ph] 3 Mar 2007

Laser-trapping of^{225}Ra and^{226}Ra with repumping by room-temperature blackbody radiation

J. R. Guest,^1 N. D. Scielzo,^1 I. Ahmad,^1 K. Bailey,^1 J. P. Greene,^1 R. J. Holt,^1 Z.-T. Lu,^{1, 2} T. P. O’Connor,^1 and D. H. Potterveld^1 1Physics Division, Argonne National Laboratory, Argonne, Illinois 60439 2Department of Physics and the Enrico Fermi Institute, University of Chicago, Chicago, Illinois 60637 (Dated: December 30, 2016)

We have demonstrated Zeeman slowing and capture of neutral^{225} Ra and^{226} Ra atoms in a magneto-optical trap. The intercombination transition^1S0→^3P1 is the only quasi-cycling transition in radium and was used for laser-cooling and trapping. Repumping along the^3D1→^1P1 transition extended the lifetime of the trap from milliseconds to seconds. Room-temperature blackbody radiation was demonstrated to provide repumping from the metastable^3P0 level. We measured the isotope shift and hyperfine splittings on the^3D1→^1P1 transition with the laser-cooled atoms, and set a limit on the lifetime of the^3D1 level based on the measured blackbody repumping rate. Laser-cooled and trapped radium is an attractive system for studying fundamental symmetries.

PACS numbers: 32.80.Pj, 24.80.+y, 32.80.Ys, 44.40.+a, 32.10.Fn

Radium is an alkaline-earth element with no stable isotopes, and as a result has eluded detailed spectroscopic studies. Recent calculations have suggested that radium, due to its nuclear and atomic properties, is an excellent candidate for next generation fundamental symmetry tests. The observation of a permanent electric dipole moment (EDM) in an atom, molecule, or the neutron would signal the long sought-after violation of timereversal symmetry (T -violation, or CP -violation through the CP T theorem) in a composite particle. Currently, the most stringent limits on T -violating interactions in the nucleus are set by experiments that determined the atomic EDM of^{199}Hg to be < 2.1 × 10^{−28} e cm [1]. Both collective [2] and mean-field [3] calculations have predicted that radium isotopes which are characterized by nuclear octupole deformation are two to three orders of magnitude more sensitive to T -violating interactions in the nucleus than^{199}Hg [4, 5].^{225}Ra is a particularly promising candidate for an EDM search because it has a relatively long half-life (t_{1/2} = 14.9 days) and it has nuclear spin I = 1/2 (like^{199}Hg), which eliminates potential systematic electric quadrupole shifts in EDM measurements. In addition to the atomic EDM, atomic parity violation effects are also enhanced by a few orders of magnitude in radium due to the near degeneracy between the parity-odd^3P_1 level and the parity-even 3D_2 level [6, 7], which are believed to be only 5 cm^{−1} apart [8]. Conventional atomic-beam or vapor-cell approaches to these EDM or parity-violation measurements are precluded because of the scarcity and low vapor pressure of radium, respectively. Instead, a measurement on atoms laser-cooled and confined in a far-off resonant optical dipole trap or lattice offers a promising path [9].

In this Letter, we report on the first realization of lasercooling and trapping of^{225}Ra and^{226}Ra (t_{1/2}=1600 yr, I=0). This is the heaviest and only the second element with no stable isotopes (after francium [10]) laser-trapped

FIG. 1: (Color online) Energy level diagram and decay rates for radium. Energies [8] are indicated at the left, and calculated decay rates [11] are shown (^3P1 lifetime comes from experiment [12]). The 300 K blackbody photon number density is shown on the same energy scale in the inset.

to date. Radium is unique among alkaline-earth elements in that the weak, intercombination transition^1S_0→^3P_1 is the only quasi-cycling transition suitable for laser-cooling and trapping.

The energy level structure [8] and decay rates [11] for the radium atom are shown in Fig. 1. While the strong, singlet to singlet transition^1S_0→^1P_1 is exploited for efficient Zeeman slowing and first-stage cooling in Mg, Ca, Sr, and Yb, the higher-Z Ra atom is limited to ≈350 cycles on this transition before it decays to longlived D levels. In contrast, the narrow intercombination 7s^{2 1}S_0→ 7s7p^3P_1 transition is calculated to afford ≈ 2.4 × 10^4 cycles before leaking to the 7s6d^3D_1 level [11, 12]. By then repumping the atom to the 7s7p^1P_1 level, which quickly decays back to the ground 7s^{2 1}S_0 level, we extend the number of laser-cooling transitions in the magneto-optical trap (MOT) to ≈ 3 × 10^7 and the laser-cooling time from tens of milliseconds to tens of seconds. As indicated by the spectrum inset in Fig. 1, room temperature blackbody radiation can also redistribute population between the^3P_1,^3D_2,^3D_1, and 3P_0 levels.

226Ra is a long-lived isotope and^{225}Ra is an αdaughter of long-lived^{229}Th (t_{1/2} = 7340 yr). Typically, ≈0.7 μCi of^{226}Ra (≈0.7 μg) and ≈1 mCi of^{225}Ra (≈25 nano-g) are dissolved in 0.1 M nitric acid, pipetted onto an Al foil and placed in an oven with ≈50 mg of Ba metal. The Ba serves the dual purpose of reducing the Ra(NO_3)_2 and passivating the oven surfaces. We typically run the oven at 600^∘C - 750^∘C and maintain a vacuum in the trap region of ≈ 10^{−8} Torr.

For laser-cooling along the^1S_0→^3P_1 transition (λ = 714 nm, Γ = 2π × 380 kHz, I_{sat} = 140 μW/cm^2), we excite along (J = 0)→(J^′ = 1) for^{226}Ra and (F = 1/2)→(F^′ = 3/2) for^{225}Ra. We use a Ti:Sapphire ring laser which is referenced to molecular iodine lines. The repump^3D_1→^1P_1 transition is excited with an external cavity diode laser at 1429 nm. The laser is locked to a Fabry-Perot cavity, which is stabilized by a He-Ne laser. For spectroscopy on the repump transition, the scanning repump laser is monitored with a wavemeter and heterodyned with a second 1429 nm external cavity diode laser which is locked to the Fabry-Perot.

The atoms emitted from the oven are first laser-cooled transversely in two dimensions and then slowed in a 0.9 m Zeeman slower, which can capture atoms with velocities up to 60 m/s (10^{−3} of the longitudinal velocity profile for T ≈ 700^∘C). Because our slow cycling transition and 3 cm laser beams yield a relatively low MOT capture velocity of 10 m/s, we used an integrated geometry in which the slower magnetic fields merge smoothly with the 1 G/cm MOT magnetic field. The transverse-cooling, slowing, and MOT beams are typically detuned from the atomic transition by -3×, -12×, and -6×Γ with intensities of 50×, 30×, and 20×I_{sat}, respectively.

After slowing and collecting atoms in the trap for ≈0.5 s, the transverse-cooling and slowing beams are shuttered and the MOT light is frequency-shifted (typically to -3×Γ) and attenuated (to 2×I_{sat} total in all beams). By chopping the MOT light at 1 MHz (50% duty cycle) and counting the fluorescence photons while the light is off, we take advantage of the long lifetime of the^3P_1 to eliminate scattered laser light and gain sen-

FIG. 2: Laser-trapping of^{226} Ra atoms. a) Spectra of the atoms in the atomic beam (multiplied by 100×, open circles) and laser-cooled in the MOT (filled circles). b) The number of atoms detected in the MOT over the 1.8 s following the shuttering (unshuttering) of the slower beam at t = 0 yields the lifetime (loading) curve which is shown by filled (open) circles. Both curves are fit by exponentials and yield the identical lifetime τ = 1.1 s for these data.

sitivity to single trapped radium atoms. We can also detect the 483 nm photon from the^1P_1→^1S_0 decay to monitor the repump rate.

In Fig. 2a, we show the fluorescence from^{226}Ra atoms in the trap chamber as a function of MOT light frequency for both the untrapped atomic beam (multiplied by 100×) and the laser-cooled atoms captured in the MOT. During this probe phase, the laser is still cooling as evidenced by the asymmetric line shape and the red-shift of the MOT signal with respect to the atomic beam signal. Figure 2b shows exponential fits to the loading and decay curves for the radium MOT, which yield a lifetime τ = 1.1 s that is consistent with the time scale for collisions with the background gas. The loading efficiency of the MOT can be defined as ϵ = L/F = N/(F τ), where L is the loading rate, F is the atomic flux from the oven, and N is the number of atoms observed in the trap. The atomic flux F of^{225}Ra is obtained by exposing a deposition target to the atomic beam and subsequently counting in situ the number of 40 keV gamma-rays emitted during the radioactive decay of the^{225}Ra nuclei using a germanium detector; the^{226}Ra flux is estimated by scaling from the^{225}Ra flux by the quantities introduced into the oven. Typically, we observe fluxes of 3 × 10^7 s^{−1} and 10^9 s^{−1} and atom trap numbers of 20 and 700 for^{225}Ra and^{226}Ra, respectively, yielding approximate efficiencies of ϵ ≈ 7 × 10^{−7} for both isotopes.

Absolute frequencies of the laser-cooling^1S_0→^3P_1 transitions can be extracted based on the known iodine line positions [13, 14]. The energies for^{225}Ra and^{226}Ra are 13999.269(1) cm^{−1} [12] and 13999.357(1) cm^{−1}, respectively. The value for^{226}Ra differs by 700 MHz from Moore’s value [8] of 13999.38 cm^{−1} which is based on the 1934 measurements by Rasmussen [15].

As shown in the inset of Fig. 1, thermal blackbody radiation at 300 K should be expected to play an important

FIG. 3: Repump events (483 nm photons) observed versus time as the repump laser is shuttered and unshuttered (lasercooling is on continuously). Experimental data (filled circles) and a double exponential fit (solid line for t > 5 ms) are shown with a dotted line indicating the steady-state repumping rate. The inset shows the relevant levels and the calculated transition rates due to spontaneous emission (straight arrows) and thermal radiation (curved arrows).

role in redistributing population between the^3P_1,^3D_2, 3D_1, and^3P_0 levels. Recognizing that our cold atoms are sitting in a bath of room temperature thermal photons, we can follow Einstein’s simple treatment to relate the spontaneous emission rates A_{ji} to the thermal transition rates B̃_{ij} (T ) = B_{ij} ρ(ω_{ij} , T ), where ρ(ω_{ij} , T ) is the blackbody photon energy density and B_{ij} is the Einstein B coefficient. For the levels in the inset of Fig. 3, we have

B̃_{ij} (T ) = g^j g_i A_{ji} e^{(Ej −Ei)/kB T} − 1 , (1)

where g_i is the degeneracy of the ith level, E_i is the energy of the ith level, and k_B is the Boltzmann constant. Taking the theoretical value for the decay along 3D_1→^3P_0 of A_{21} = 1.6 × 10^3 s^{−1} [11] and the measured energy difference of 638 cm^{−1} [8], we calculate a thermal transition rate from^3P_0→^3D_1 of B̃_{12} = 2.2 × 10^2 s^{−1} for our chamber temperature of T = 296(3) K. Therefore, room temperature blackbody radiation can drive population between these levels on millisecond time scales, as indicated by the curved arrows in the inset of Fig. 3.

This blackbody radiation mechanism can be seen directly in the data shown in Fig. 3, where we show the observed rate of repumping when shuttering and unshuttering the 1429 nm repump laser (filled circles) while the MOT light (714 nm) is left on. This repumping rate is measured directly as a function of time by recording the number of repump-induced 483 nm photons detected from the decay of the^1P_1 level (as shown in Fig. 1). When the repump laser is shuttered for the first 5 ms, population that leaks during laser-cooling accumulates in the^3D_1 level and, after radiative decay, in the metastable 3P_0 level. When the repump laser is reapplied to the cold

FIG. 4: Number of^{225}Ra and^{226} Ra atoms in the trap, as measured by fluorescence at 714 nm, vs. the wavenumber of the 1429 nm repump laser recorded by the wavemeter. The 225Ra data is scaled by 100× to compare to^{226} Ra, which is offset on the vertical scale for clarity. The repump resonances are indicated in the inset level schematic.

atoms at t = 5 ms, the atoms residing in the^3D_1 level are quickly repumped and produce the short burst of 483 nm photons seen in Fig. 3. The slowly decaying exponential tail following this initial pulse corresponds to the emptying of the metastable^3P_0 level by thermal blackbody radiation that reexcites the atoms to the^3D_1 level where they can be repumped by the 1429 nm laser. The signal then settles to a steady-state repump rate.

These data are modeled effectively by a double exponential plus an offset for t > 5 ms, shown by the solid line in Fig. 3. The time scale for the first exponential corresponds to the laser repump rate and the time scale for the second exponential corresponds to the blackbody repump rate. This fit yields a blackbody repump rate of B̃_{12} = 2.8 × 10^2 s^{−1}, which, through Eqn. 1, yields a lifetime for the^3D_1 level of 510 ± 60 μs for our chamber temperature. We interpret this as a lower limit on the lifetime because other loss mechanisms from the^3P_0 level could contribute to the decay of this curve.

In practice, this blackbody mechanism eases the requirements on the repumping laser fields because atoms which decay from the^3D_1 level to the metastable^3P_0 level will be recycled to the^3D_1 level by the thermal radiation and be exposed to the repumping laser again. This is particularly significant for^{225}Ra, which can be efficiently repumped by exciting from only one of the hyperfine manifolds. Assuming a uniform population of the^3P_1(F = 3/2) m_F states in the MOT, decay to the^3D_1(F = 3/2) states is favored 5:1 over decay to the^3D_1(F = 1/2) states. If we repump only the^3D_1(F = 3/2) states, atoms which decay to the 3D_1(F = 1/2) states will further decay to the metastable 3P_0 level. But over the time scale of 4 ms, the atoms will be recycled due to thermal radiation (as seen in Fig. 3

TABLE I: Measured hyperfine structure constants A in MHz for^{225}Ra on the repump transition compared to a previous measurement and theory (obtained by scaling calculations for 213Ra [7] and^{223} Ra [16] by the ratio of nuclear magnetic moments and the inverse ratio of the nuclear spins [17, 18]).

Experiment Theory Level This Letter ISOLDE [18] [7] [16] 3D1 4687.7 (1.5) 4915 4981 1P1 2797.3 (1.5) 2796.5 (2.5) 1972 2688

for^{226}Ra) to the (F = 3/2) states and repumped. This effect can also be seen in Fig. 4, which shows the number of^{225}Ra and^{226}Ra atoms observed in the trap as a function of the tuning of the repump laser; the four lines for 225Ra correspond to (F = 1/2, 3/2) → (F^′ = 1/2, 3/2) as indicated in the inset. While most efficient along (F = 3/2) → (F^′ = 3/2), repumping on any of the four transitions leads to a significant increase (10×-100×) in the number of trapped^{225}Ra atoms.

By comparing the center frequencies of the^{225}Ra and 226Ra lines, we have measured the isotope shift on the 3D_1→^1P_1 transition to be ν^{226} − ν^{225} = 540.2(2.0) MHz. We have also extracted the hyperfine structure constants A for^{225}Ra, where the hyperfine energy splitting E(F = 3/2) − E(F = 1/2) = 3/2 hA. These values are presented in Table I and compared with theory [7, 16]. Our measurement agrees well with the previous measurement of A for the^1P_1 state at ISOLDE [18].

Figure 4 also shows that the^3D_1→^1P_1 repump transition energy in^{226}Ra is measured to be 6999.84(2) cm^{−1}. This confirms Russell’s 1934 adjustment [19] to the original arc spectrum published by Rasmussen [15], which shifted the D-level and F -level energies by +628 cm^{−1}. This measurement resolves the conflict between calculations which were consistent with the correction [11, 20] and theoretical concerns that these levels could be much lower in energy [21], which would have presented much stronger leak channels from the^3P_1 level and therefore made laser-cooling significantly more difficult. It also suggests that the apparent near-degeneracy of the^3P_1 and^3D_2 levels [8] which would enhance atomic parity violation effects in radium should be correct [6, 7].

The successful laser trapping of^{225}Ra and^{226}Ra has opened the possibility of studying fundamental symmetries with cold, trapped radium atoms. Furthermore, to our knowledge, this is the first demonstration that blackbody radiation can serve as an effective repump source. This mechanism may find more uses in laser trapping of atoms with complex structure [22]. In an EDM search, we estimate that a statistical sensitivity of 10^{−26} e cm can be achieved using a 10 mCi^{225}Ra source with the demonstrated trapping efficiency. Due to radium’s enhanced sensitivity to nuclear T -violating interactions, a search with this level of sensitivity would be competitive with the best current limits set in the nuclear sector [1].

We would like to thank M. Williams and D. Bowers for technical support and E. Schulte for early work on the 225Ra oven. We would also like to thank V. Flambaum, V. Dzuba, H. Gould, P. Mueller, K. Wendt and R. Santra for helpful discussions. This work was supported by the U.S. Department of Energy, Office of Nuclear Physics, under Contract No. DE-AC02-06CH11357.

[1] M. V. Romalis et al., Phys. Rev. Lett. 86, 2505 (2001). [2] N. Auerbach, V. V. Flambaum, and V. Spevak, Phys.

Rev. Lett. 76, 4316 (1996); V. Spevak, N. Auerbach, and V. V. Flambaum, Phys. Rev. C 56, 1357 (1997); V. V. Flambaum and V. G. Zelevinsky, ibid. 68, 035502 (2003).

[3] J. Engel, J. L. Friar, and A. C. Hayes, Phys. Rev. C 61, 035502 (2000); J. Engel et al., ibid. 68, 025501 (2003); J. Dobaczewski and J. Engel, Phys. Rev. Lett. 94, 232502 (2005).

[4] V. A. Dzuba et al., Phys. Rev. A 66, 012111 (2002). [5] J. H. de Jesus and J. Engel, Phys. Rev. C 72, 045503 (2005).

[6] V. V. Flambaum, Phys. Rev. A 60, R2611 (1999). [7] V. A. Dzuba, V. V. Flambaum, and J. S. M. Ginges, Phy.

Rev. A 61, 062509 (2000).

[8] C. E. Moore, Atomic Energy Levels, Vol. III, Natl. Stand.

Ref. Data Ser., Nat. Bur. Stand. (U.S.), 35 (1971); reprint of Natl. Bur. Stand. (U.S.) Circ. 467 (1958).

[9] M. V. Romalis and E. N. Fortson, Phys. Rev. A 59, 4547 (1999); C. Chin et al., ibid. 63, 033401 (2001).

[10] J. M. Simsarian et al., Phys. Rev. Lett. 76, 3522 (1996);

Z.-T. Lu et al., ibid. 79, 994 (1997).

[11] V. A. Dzuba and J. S. M. Ginges, Phys. Rev. A 73, 032503 (2006); V. A. Dzuba and V. V. Flambaum, J. Phys. B 40, 227 (2007).

[12] N. D. Scielzo et al., Phys. Rev. A 73, 010501(R) (2006). [13] S. Gerstenkorn, J. Verges and J. Chevillard, Atlas du Spectre D’Absorption de la Molecule D’Iode (Laboratoire Aime Cotton, Orsay, France, 1982).

[14] H. Knöckel, B. Bodermann and E. Tiemann. Eur. Phys.

J. D 28, 199 (2004).

[15] E. Rasmussen, Z. Physik 87, 607 (1934).

[16] J. Bieroń and P. Pyykkö, Phys. Rev. A 71, 032502 (2005); J. Bieroń, J. Phys. B 38, 2221 (2005).

[17] E. Arnold et al., Phys. Rev. Lett. 59, 771 (1987). [18] S. A. Ahmad et al., Phys. Lett. 133B, 47 (1983); K.

Wendt et al., Z. Phys. D 4, 227 (1987). [19] H. N. Russell, Phys. Rev. 46, 989 (1934). [20] E. Eliav, U. Kaldor, and Y. Ishikawa, Phys. Rev. A 53, 3050 (1996).

[21] J. Bieroń et al., J. Phys. B 37, L305 (2004). [22] J. J. McClelland and J. L. Hanssen, Phys. Rev. Lett. 96, 143005 (2006).