arXiv:q-bio/0702057v1 [q-bio.MN] 27 Feb 2007

BIOINFORMATICS^{Vol. 00 no. 00 2007}Pages 1–4

Detection of the dominant direction of information flow in densely interconnected regulatory networks

I. Ispolatov^{a∗}, S. Maslov^b

a Ariadne Genomics Inc., 9430 Key West Ave. Suite 113 Rockville, MD 20850, USA,^b Department of Condensed Matter Physics and Materials Science, Brookhaven National Laboratory, Upton, New York 11973, USA

ABSTRACT Motivation: Finding the dominant direction of flow of information in densely interconnected regulatory or signaling networks is required in many applications in computational biology and neuroscience. This is achieved by first identifying and removing links which close up feedback loops in the original network and hierarchically arranging nodes in the remaining network. In mathematical language this corresponds to a problem of making a graph acyclic by removing as few links as possible and thus altering the original graph in the least possible way. Practically in all applications the exact solution of this problem requires an enumeration of all combinations of removed links, which is computationally intractable.

Results: We introduce and compare two algorithms: the deterministic, ’greedy’ algorithm that preferentially cuts the links that participate in the largest number of feedback cycles, and the probabilistic one based on a simulated annealing of a hierarchical layout of the network which minimizes the number of “backward” links going from lower to higher hierarchical levels. We find that the annealing algorithm outperforms the deterministic one in terms of speed, memory requirement, and the actual number of removed links. Implications for system biology and directions for further research are discussed. Availability: Source codes of F 90 and Matlab implementation of these two algorithms are available from the authors upon request. Contact: ,

1 INTRODUCTION During the last several years, a substantial amount of information on large-scale structure of intracellular regulatory networks has been accumulated. However, the growth in our understanding of how these networks manage to function in a robust and specific manner was lagging behind the shear rate of data acquisition. The fact these networks are frequently visualized as a giant “hairball” (Fig. 1) consisting of a multitude of edges, linking most constituent proteinnodes to each other serves as a striking illustration of the complexity of the issue at hand.

To understand the functioning or even to efficiently visualize a densely interconnected directed network it is desirable to determine the dominant direction of information flow and to identify links that go against this flow and thus close feedback loops. Ordering a network with respect to the dominant direction of information flow can help to determine its previously unknown inputs and outputs,

∗Permanent address: Departamento de Fisica, Universidad de Santiago de Chile, Casilla 302, Correo 2, Santiago, Chile to track back hidden sources of perturbations based on their observable downstream effects, etc. A simple-minded hierarchical layout of a densely interconnected network is often impossible due to a ubiquitous presence of feedback loops. Indeed, all nodes in a strongly connected component of a network by definition are simultaneously upstream and downstream of each other. However, if most feedback loops are closed by relatively few feedback signaling links, the dominant direction of information flow could still be reconstructed based on a network topology alone. An identification and removal of these relatively infrequent feedback links would enable one to perform a hierarchical layout of the remaining acyclic network which still sufficiently resembles the original one.

In this work we consider the problem of identifying the minimum set of links, removal of which would render a graph acyclic. In the next section we introduce two rather different algorithms allowing one to approximately accomplish this goal, a deterministic ’greedy’ algorithm and a probabilistic Metropolis annealing, and compare their performance. We find that the probabilistic algorithm outperforms the deterministic one in better minimizing the number of removed links, and memory requirements, while maximizing the speed. A simple visual example is provided for the situation when the deterministic algorithm is non-optimal. Following that, we discuss biological implications and applications of our findings as well as how additional constraints such as a priori knowledge of the function and therefore hierarchical position of certain nodes may affect the algorithm performance.

2 APPROACH Consider a graph of N vertices labeled as 1, 2, 3, . . . , N and L directed links labeled by pairs of vertices they connect, li ≡ (ni, mi). The goal is to remove as few as possible of the links to make the graph acyclic, or feedback-free.

An exact way to solve this problem is to sample all possible combinations of links to be removed, starting with enumerating individual links, then pairs of links, etc, until the first acyclic graph is obtained. Evidently, if a removal of l links finally yields an acyclic graph, such sampling would require checking the ∑_l i=1 (_L i ) networks for cycles. For the biologically relevant values of L ∼ 10^3 − 10^4 and l ∼ 10 − 10^2 this approach is clearly unfeasible.^1

1 From an obvious identity, ∑_{L/2} i=1 (_L i ) = 2^{L−1}, it follows that even for fairly modest L = 10^2 and l = L/2 the number of such attempts is ∼ 10^{15}.

© Oxford University Press 2007. 1

Ispolatov, I. and Maslov, S.

Fig. 1. Caption, A part of the post-translational regulatory network in human shown here includes 1671 automatically and manually curated protein modification interactions (phosphorylation, proteolytic cleavage, etc.) between 732 proteins from our ResNet database Nikitin et al., 2003. Panel A contains the “hairball” visualization of the network structure emphasizing interconnections between individual pathways. Red edges lie within the strongly connected component of this network consisting of 107 proteins that could all be linked to each other by a path in both directions. This makes any two of these proteins to be simultaneously upstream and downstream from each other. In Panel B we optimally distribute proteins over a number of hierarchical levels. Red arrows represent 208 putative feedback links going from lower levels of the hierarchy to higher ones, while yellow ones – 512 feed-forward links jumping over one or more hierarchical levels. Only proteins and links reachable from one of the 71 receptors placed at the top hierarchical level were included.

Fig. 2. Caption, Removal of a single (3, 1) link makes this 3-vertex graph acyclic.

2.1 Greedy algorithm A natural reduction of such exact enumeration approach is a “greedy” algorithm which performs the “steepest descent” in the number of cycles. We implemented the following realization of such link removal algorithm:

• By enumerating all cycles in a graph, each link is assigned a score equal to the number of cycles it is a member of.

• The link with the highest score is removed. When more than one link have the same highest score, a link to be removed is selected among the highest-scored ones by random.

• This procedure of cycle enumeration and link removal is repeated until no cycles are found.

The cycle enumeration can be implemented by following all paths that originate from a given vertex and recording only the cycles that come back to this vertex. The procedure is repeated for each of the N graph vertices: evidently, each cycle of length C is counted C times and a proper normalization is performed.

An example of network where the greedy algorithm performs flawlessly is shown in Figure 2.

Here the link (3, 1) carries the maximum score 2. A removal of this link indeed makes the graph acyclic, while a removal of any other than (3, 1) link would require a subsequent removal of the second link to achieve the same goal. However, one would suspect that as any “steepest descent” method, the proposed greedy algorithm, performing a sometimes near-sighted local one-step optimization, may miss the globally optimal solution. This is indeed often the case for bigger and more complex graphs; a fairly simple example is given in Fig. 3.

2.2 Simulated annealing network ordering The task of finding the minimum number of links, cutting which makes the graph acyclic, can be interpreted as an optimization problem and tackled by probabilistic methods such as simulated annealing. Evidently, there exist more than one way to define the optimization function, and after exploring several possibilities we converged to the following one:

• For a given network, a set of M levels is introduced (M ≤ N, in reality, M ≪ N and is of the order of the graph diameter). Initially, all nodes are distributed on the levels randomly.

• For a particular distribution of nodes on levels, the number of links that go opposite to the hierarchy, that is, from a lower level to the same or a higher one, is declared to be the energy E of the distribution, or the optimization function.

Short title

Fig. 3. Caption, An example of network where the greedy algorithm fails to determine the optimal solution. The link (1, 2) carries the highest score 3 and thus is cut first. However, three 2-node cycles {2, 3}, {2, 4}, and {2, 5} remain to be eliminated, after which the number of removed links becomes 4. The optimal solution would be to cut only three links (2, 3), (2, 4), and (2, 5), each carrying the score 2. This optimal solution has almost always been found by the annealing algorithm.

Fig. 4. Caption, Node 1 with two incoming and one outcoming link is selected to move from its current position on level j to a new position on level j + 2. The associate energy difference is ΔE = −1 − 1 + 1 = −1 where two -1 contributions come from making (2, 1) and (3, 1) links hierarchical and the single +1 contribution comes from turning the link (1, 4) from hierarchical to non-hierarchical.

• A node and its new level are selected at random. A difference in energy ΔE that would occur if the node were moved to the new level is calculated. The node is moved to this new level with the probability min{1, exp(−ΔE/T }, where T is the temperature.

• After the network has been sampled a sufficient number of times (of the order of N × M), the temperature is reduced by some factor, usually 0.9. Initially, the temperature is set sufficiently high, usually of the order of the average node degree L/N, to allow un-obstructed level changes.

• When the temperature becomes low enough to inhibit any level changes, the remaining ascending and in-level links are declared feedbacks and removed.

• The whole procedure can be repeated several times to check for consistency in the assignment of feedback links and to determine the lowest in the number of removed links solution.

A change of level event and the associated energy difference is illustrated in Fig. 4

Fig. 5. Caption, The number of non-hierarchical links vs the number of levels M in the annealing layout of the combined (a union of Peri et al., 2003 and Nikitin et al., 2003 datasets) protein phosphorylation network in human cell. The network consists of L = 2880 links and N = 1297 nodes (proteins). The nodes with zero in-degree and zero out-degree are always put on the top and bottom levels, correspondingly. The leftmost data point corresponds to the single intermediate level (3 levels total), the number of non-hierarchical links clearly reaches its minimum of 59 links for M ≥ 18.

A useful property of this algorithm is that in addition to making a network acyclic, it also produces a hierarchical layout. The number of levels M could be fixed by the requirements for such layout. Otherwise, M could be determined self-consistently, by observing when the number of counter-hierarchical links stops to decrease upon the increase in the number of levels. This is illustrated in Fig. 5 where a plot of the number of non-hierarchical links vs number of levels is presented for the human protein phosphorylation network.

3 DISCUSSION In the previous section we introduced two algorithms intended to make a network acyclic by removing the least number of links. The stochastic stimulated annealing level-ordering algorithm outperforms the deterministic greedy algorithm in all respects. Indeed, the greedy algorithm requires tracking along all paths originating from a given vertex, which uses a lot of memory and slows the performance significantly. We found it impractical to apply the greedy algorithm to networks with more than 100 – 200 vertices. This rules out its use for all-organism network ordering and limits its utility to analyzing isolated systems and pathways. In addition, as we also showed above, it often fails to find the optimum solution, while the properly executed stimulated annealing always has a certain probability of converging to it. That said, there is a grain of biological utility in the ability to determine how many cycles pass through a given link. Indeed, the demands for robustness in evolution of bio-molecular networks may have resulted in a vast redundancy of pathways sending signals along the dominant direction of information flow and thus in a relative scarcity of links going in the opposite direction. Many of these “backwards” links simultaneously close up multiple feedback loops. The identification of such highly universal feedback links is facilitated by the first, cycle counting stage of the greedy algorithm.

Ispolatov, I. and Maslov, S.

Often there exist some a priori knowledge on the hierarchical positions of certain network nodes. For example, many of the receptor proteins localized in the membrane upon activation pass the signals downstream signaling cascades made of proteins localized in the cytoplasm and ultimately in the cell’s nucleus. Thus receptor proteins might have to be forcefully put on the upper levels of the hierarchical layout of such signaling network. Contrary to receptors, many transcription factors serve the role of effectors of signaling pathways and thus must occupy the lowest levels of the hierarchy. Initial, or possibly permanent, position of such nodes on the hierarchical levels often helps to converge to the better in terms of fewer feedback links, or more biologically relevant solution.

In a similar way, the orientation of certain links (or equivalently, pairs of nodes) could be quenched if they are known to be of the feed forward of feed back nature. Based on the initial knowledge of network functioning, it is also possible to assign a certain weight to a link, so that the energy E of a particular assignment of nodes to layers is a sum of weights of the counter-hierarchical links. Thus the a priori known plausibility of a link to be (or not to be) a feedback can be introduced into the layering algorithm.

It is also possible to improve the visual perception of the layout by shortening the hierarchical links. In its present edition, a “good” or hierarchical link may be arbitrary long, i.e. go down many levels, without carrying any energetic penalty. This interferes with identifying the hierarchical levels as certain stages of network flow. Introduction of a small energetic penalty for particularly long links may alleviate this shortcoming.

We leave these questions as well as those of particular application of ordering algorithms to catalytic signaling and transcription regulation cellular networks for future studies and publications.

ACKNOWLEDGEMENT This work was supported by 1 R01 GM068954-01 grant from the NIGMS. Work at Brookhaven National Laboratory was carried out under Contract No. DE-AC02-98CH10886, Division of Material Science, U.S. Department of Energy. II thanks Theory Institute for Strongly Correlated and Complex Systems at BNL for financial support during his visits.

REFERENCES

Nikitin, A., et al (2003) Pathway studio - the analysis and navigation of molecular networks Bioinformatics 19, 1-3.

Peri, S. et al. (2003) Development of human protein reference database as an initial platform for approaching systems biology in humans. Genome Research 13, 2363- 2371.